SCHEDULE 1

CHARGES FOR ELASTIC HOSIERY
Regulations 3, 4 and 5
Column 1 | Column 2
Specified Appliance | Specified Sum
Above knee stocking, below knee stocking or thigh Stocking | £6.10 each (ie £12.20 per pair)