PART II

WORKS

Lights on tidal works during construction
14
1
During the whole time of demolition, construction, renewal or alteration of any tidal work the Comhairle shall at the outer extremity thereof every night from sunset to sunrise exhibit such lights, if any, and take such other steps for the prevention of danger to navigation as the Commissioners of Northern Lighthouses shall from time to time direct.
2
If the Comhairle fail to comply in any respect with paragraph (1) above they shall be guilty of an offence and liable on summary conviction to a fine not exceeding the statutory maximum and on conviction on indictment to a fine.