Scottish Statutory Instruments
2000 No. 95
ENVIRONMENTAL PROTECTION
The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Regulations 2000
Made 31st March 2000
Laid before the Scottish Parliament 31st March 2000
Coming into force 8th May 2000

The Scottish Ministers, in exercise of the powers conferred upon them by section 2(2) of the European Communities Act 1972 and of all other powers enabling them in that behalf, hereby make the following Regulations:
1972 c.68: Section 2(2) was amended by the Scotland Act 1998 (c.46) Schedule 8 paragraph 15(3). The function conferred upon the Minister of the Crown under section 2(2) of the 1972 Act, insofar as within devolved competence, was transferred to the Scottish Ministers by virtue of section 53 of the Scotland Act 1998.

PART I GENERAL

Citation, commencement and extent
1. (1) These Regulations may be cited as the Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Regulations 2000 and shall come into force on 8th May 2000.
(2) These Regulations extend to Scotland only.

Interpretation and notices
2. (1) In these Regulations–
“the 1995 Act” means the Environment Act 1995 ;
“applicant” means a person who applies for registration under regulation 6;
“contaminated equipment” means any equipment (including any transformer, capacitor or receptacle containing residual stocks) which–
(a) contains PCBs; or
(b) having contained PCBs, has not been decontaminated,
other than one which contains a total volume of PCBs, not exceeding 5 dm3, and for the purposes of this definition–
(i) the PCB volume of a power capacitor shall be measured by reference to all of the separate elements of a combined set; and
(ii) any thing of a type which may contain PCBs shall be treated as containing PCBs unless it is reasonable to assume the contrary;
“decontamination” means all operations which enable equipment, objects, materials or fluids contaminated by PCBs to be reused, recycled or disposed of under safe conditions, and which may include replacement, meaning all operations in which PCBs are replaced by suitable fluids not containing PCBs;
...
“disposal” means any of the operations D8, D9, D10, D12 (only in safe, deep, underground storage in dry rock formations and only for equipment containing PCBs or used PCBs which cannot be decontaminated) and D15 provided for in Part II of schedule 4 of the Waste Management Licensing (Scotland) Regulations 2011 and set out in Schedule 1 to these Regulations;
“holder” means the person who is in possession of PCBs, including any used PCBs or of any equipment;
“PCBs” means any of the following substances:–
polychlorinated biphenyls;
polychlorinated terphenyls;
monomethyl-dibromo-diphenyl methane;
monomethyl-dichloro-diphenyl methane;
monomethyl-tetrachlorodiphenyl methane,
and, except in regulations 4(3A), (3C) and (4), 5(3) and (4), and 9(3), includes any mixture containing any of those substances in a total of more than 0.005% by weight;
“registered holder” means a person registered with SEPA in accordance with regulation 6, and a registered holder is a registered holder in relation to particular equipment if a description of that equipment, including its location, has been furnished to SEPA;
“SEPA” means the Scottish Environment Protection Agency, established under section 20 of the 1995 Act;
“transformer” includes ancillary equipment, that is to say, equipment that is an integral part of the site of which the transformer is part, including radiators, bushings, through-wall bushings, and capacitors on air blast circuit breakers;
“used PCBs” mean any PCBs which are waste within the meaning of section 75(2)(a) of the Environmental Protection Act 1990 as read with section 75A of that Act.
(2) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Reg. 2(2) omitted (31.12.2020) by virtue of The Environment (EU Exit) (Scotland) (Amendment etc.) Regulations 2019 (S.S.I. 2019/26), regs. 1, 8(2)(b); 2020 c. 1, Sch. 5 para. 1(1)
(3) Any reference in these Regulations to a numbered regulation is a reference to the regulation so numbered in these Regulations and any reference to a numbered paragraph is a reference to the paragraph so numbered in the regulation of which that paragraph forms part.
(4) Section 123 (service of documents) of the 1995 Act shall apply to any notice required or authorised by these Regulations to be served as it applies to notices required or authorised to be served by that Act.
1995 c.25.
Words in reg. 2(1) omitted (31.12.2020) by virtue of The Environment (EU Exit) (Scotland) (Amendment etc.) Regulations 2019 (S.S.I. 2019/26), regs. 1, 8(2)(a)(i); 2020 c. 1, Sch. 5 para. 1(1)
Words in reg. 2(1) substituted (31.12.2020) by virtue of The Environment (EU Exit) (Scotland) (Amendment etc.) Regulations 2019 (S.S.I. 2019/26), regs. 1, 8(2)(a)(ii); 2020 c. 1, Sch. 5 para. 1(1)
Words in reg. 2(1) substituted (14.2.2021) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(2)
Words in reg. 2(1) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(2)
Words in reg. 2(1) substituted (31.12.2020) by virtue of The Environment (EU Exit) (Scotland) (Amendment etc.) Regulations 2019 (S.S.I. 2019/26), regs. 1, 8(2)(a)(iii); 2020 c. 1, Sch. 5 para. 1(1)

PART II HOLDING, LABELLING, DECONTAMINATION AND DISPOSAL

Prohibition on holding without registration
3. (1) Subject to paragraphs (2) to (4), no person shall hold any contaminated equipment after 31st July 2000, unless that person is a registered holder of that equipment.
(2) A person may hold contaminated equipment, notwithstanding that such person is not a registered holder, for the purposes of, or in the course of, any business, manufacturing process or trade concerned with the decontamination or disposal of such equipment.
(3) A person who applies for registration, in accordance with regulations 6(1) and (2) and 12, no later than 22nd May 2000 but whose application has not been finally determined by 31st July 2000 shall be treated as a being a registered holder until 14 days after his application is finally determined.
(4) A person who first holds contaminated equipment on or after 8th May 2000 shall be treated as being a registered holder from the date on which that person firstholds such equipment until 14 days after the application by that person for registration is finally determined, if that person applies for registration, in accordance with regulations 6(1) and (2) and 12, no later than 28 days after the date on which that person becomes the holder of contaminated equipment.
(5) For the purposes of this regulation, an application is finally determined–
(a) where it is granted under regulation 6(3), on the date on which it is granted;
(b) where it is refused under regulation 6(3), on the date on which SEPA gives notice under regulation 6(5);
(c) where it is deemed by regulation 6(6) to be refused–
(i) where the period allowed for appealing against that refusal under regulation 8(2)(a) expires without an appeal being brought, on the expiry of that period;
(ii) where an appeal to the Scottish Ministers is taken within that period, on the expiry of the period of 28 days beginning with the date of the determination or earlier withdrawal of that appeal, without an appeal being taken to the sheriff under regulation 8(5);
(iii) where an appeal to the sheriff is taken under regulation 8(5), on the expiry of the time period for any further appeal following determination without such further appeal being taken or, if there is no further right of appeal, the date of final disposal of the matter (or in either case the date of withdrawal of the appeal).

Prohibition on holding irrespective of registration
4. (1) Subject to paragraphs (2) to (3D), (5) and (9) to (12), no person shall, after 31st December 2000, hold–
(a) any PCBs, including any used PCBs; or
(b) any equipment (whether or not that equipment is contaminated equipment)–
(i) which contains PCBs; or
(ii) which, having contained PCBs, has not been decontaminated.
Words in reg. 4(1) substituted (14.2.2021) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(3)(a)
(2) A person may hold–
(a) PCBs, including any used PCBs, or equipment for the purposes of, or in the course of any business, manufacturing process or trade concerned with the decontamination or disposal of PCBs or such equipment;
(b) PCBs, including any used PCBs, which are manufactured, supplied or used solely for the purposes of analysis or research connected with the properties and effects of PCBs, and any equipment used as a receptacle for those PCBs, provided that any such PCBs and equipment are disposed of as soon as possible after the PCBs are no longer required for those purposes.
(3A) Paragraph (3B) applies to a transformer in respect of which it is reasonable to assume that it contains—
(a) 0.005% by weight, or less, of PCBs within the fluids containing PCBs, or
Words in reg. 4(3A)(a) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(3)(a)(ii)
(b) a total volume of 0.05 dm3, or less, of fluids containing PCBs.
Words in reg. 4(3A)(b) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(3)(a)(iii)
Reg. 4(3A)-(3D) substituted for reg. 4(3) (14.2.2021) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(3)(b)
Words in reg. 4(3A) substituted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(3)(a)(i)
(3B) A transformer to which this paragraph applies—
(a) may be held until the end of its useful life, and
(b) must then be decontaminated in accordance with paragraph (4)(b) to (d), or disposed of, as soon as possible.
(3C) Paragraph (3D) applies to a transformer in respect of which it is reasonable to assume that it contains—
(a) more than 0.005% but no more than 0.05% by weight of PCBs within the fluids containing PCBs, and
Words in reg. 4(3C)(a) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(3)(b)(ii)
(b) a total volume of more than 0.05 dm3 of fluids containing PCBs.
Words in reg. 4(3C)(b) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(3)(b)(iii)
Words in reg. 4(3C) substituted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(3)(b)(i)
(3D) A transformer to which this paragraph applies—
(a) may be held until the end of 31 December 2025, and
(b) must then be decontaminated in accordance with paragraph (4)(b) to (d), or disposed of, as soon as possible.
(4) A transformer in respect of which it is reasonable to assume that the fluids contain more than 0.05% by weight shall be decontaminated under the following conditions:–
(a) the objective of the decontamination must be to reduce the content of PCBs in the fluid to 0.005% by weight, or less, or to reduce the total volume of fluids containing PCBs to 0.05 dm3, or less;
Words in reg. 4(4)(a) substituted (14.2.2021) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(3)(c)
Words in reg. 4(4)(a) substituted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(3)(c)
(b) the replacement fluid not containing PCBs must entail markedly lesser risks;
(c) the replacement of the fluid must not compromise the subsequent disposal of the PCBs; and
(d) the labelling of the transformer must be replaced by the labelling specified in Schedule 2 to these Regulations after its decontamination.
(5) SEPA may, on an application in writing (or in an electronic form acceptable to SEPA) made by a holder and if they are satisfied as to the matters specified in paragraph (7), by a direction in writing (or in electronic form) given to the holder before 31st December 2000 provide that paragraph (1) shall not apply in relation to such equipment as is specified in the direction, until such date, being after 31st December 2000 but before 1st January 2008, as shall be specified in the direction; but no such direction shall have effect, unless it is confirmed by the Scottish Ministers.
(6) The Scottish Ministers may confirm a direction under paragraph (5) with or without modifications or may refuse to confirm it.
(7) The matters referred to in paragraph (5) are–
(a) that the equipment will be replaced as part of a major programme for the replacement of an installation or plant of which the equipment is part (“the programme”);
(b) that the programme was approved by the owner or other person in control of the operation of the installation or plant before the date on which these Regulations are made;
(c) that the equipment will be disposed of by the date to be specified in the direction;
(d) that to require the disposal of the equipment before that date would disrupt the programme to a significant extent; and
(e) that all reasonable precautions have been taken to secure that PCBs cannot escape from the equipment pending its disposal.
(8) Equipment in respect of which a direction is given and has effect under paragraph (5) shall, unless decontaminated or disposed of before the date specified in the direction, be disposed of on that date.
(9) Paragraph (10) applies to any equipment containing PCBs—
(a) which is equipment to which none of paragraphs (2) to (3D), (5) and (11) to (12) applies,
(b) which is not contaminated equipment, and
(c) which is part of other equipment which is also not contaminated equipment.
Reg. 4(9)-(14) substituted for reg. 4(9) (14.2.2021) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(3)(d)
(10) Equipment to which this paragraph applies—
(a) may be held until that other equipment referred to in paragraph (9)(c) is taken out of use, recycled or disposed of, or until the end of 31 December 2025, whichever occurs earlier, and
(b) must then, where reasonably practicable, be removed and collected separately from that other equipment.
(11) Paragraph (12) applies to any equipment containing PCBs—
(a) which is equipment to which none of paragraphs (2) to (3D), (5) and (9) to (10) applies,
(b) which is relevant equipment, and
(c) which is part of other equipment which is also relevant equipment.
(12) Equipment to which this paragraph applies—
(a) may be held until that other equipment is taken out of use, recycled or disposed of, and
(b) must then, where reasonably practicable, be removed and collected separately from that other equipment.
(13) In paragraph (11), “relevant equipment” means any equipment (including any capacitor or receptacle containing residual stocks) which—
(a) contains PCBs, or
(b) having contained PCBs, has not been decontaminated,
other than equipment which contains a total volume of PCBs exceeding 0.05 dm3.
(14) For the purposes of paragraph (13)—
(a) the PCB volume of a power capacitor shall be measured by reference to all of the separate elements of a combined set, and
(b) any thing of a type which may contain PCBs shall be treated as containing PCBs unless it is reasonable to assume the contrary.

Labelling of contaminated equipment
5. (1) The registered holder of any contaminated equipment in respect of which an inventory is to be, or has been, made under regulation 9 shall affix to that equipment and to the doors of premises where such equipment is located an indelible sign and, subject to regulation 4(4)(d), shall take reasonable steps to secure that the sign remains so affixed while that equipment remains at that location.
(2) Subject to paragraph (3), such sign shall record that the equipment is, or the premises contain equipment that is, contaminated by PCBs.
(3) Equipment in respect of which it is reasonable to assume that ...—
(a) within the equipment the fluids contain between 0.05% and 0.005% by weight of PCBs, or
Words in reg. 5(3)(a) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(4)(a)(ii)
(b) the equipment contains between 5dm3 and 0.05dm3 of fluids containing PCBs,
Words in reg. 5(3)(b) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(4)(a)(iii)(aa)
Words in reg. 5(3)(b) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(4)(a)(iii)(bb)
may be labelled as “PCBs contaminated <0.05% or <5dm3.
Reg. 5(3) substituted (14.2.2021) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(4)(a)
Words in reg. 5(3) omitted (4.4.2025) by virtue of The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(4)(a)(i)
(4) Equipment in respect of which it is reasonable to assume that ...—
(a) within the equipment the fluids contain 0.005% by weight, or less, of PCBs, or
Words in reg. 5(4)(a) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(4)(b)(ii)
(b) the equipment contains a total volume of 0.05 dm3, or less, of fluids containing PCBs,
Words in reg. 5(4)(b) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(4)(b)(iii)(aa)
Words in reg. 5(4)(b) inserted (4.4.2025) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(4)(b)(iii)(bb)
may be labelled as “PCBs contaminated <0.005% or <0.05 dm3.
Reg. 5(4) inserted (14.2.2021) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(4)(b)
Words in reg. 5(4) omitted (4.4.2025) by virtue of The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment (No. 2) Regulations 2025 (S.S.I. 2025/78), regs. 1(3), 2(4)(b)(i)

PART III REGISTRATION OF HOLDERS OF CONTAMINATED EQUIPMENT

Registration
6. (1) An application for registration shall, subject to paragraph (2)–
(a) be made in writing on a form provided by SEPA; and
(b) contain the following particulars:–
(i) the name and address of the applicant;
(ii) a description of the contaminated equipment, identifying its location or intended location;
(iii) a description of the PCBs which are or were contained in the equipment, so far as can reasonably be identified without excessive cost;
(iv) so far as can reasonably be ascertained without excessive cost, the quantity of such of those PCBs as have been identified; and
(v) every date on which treatment or replacement was carried out or is envisaged, specifying in each case the nature of the treatment or replacement.
(2) Information of the descriptions–
(a) in paragraph (1) may be provided in an electronic form acceptable to SEPA;
(b) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Reg. 6(2)(b) omitted (14.2.2021) by virtue of The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(5)
(3) An application for registration shall be granted where the applicant has complied with paragraph (1) and shall otherwise be refused.
(4) Where an application for registration is granted, SEPA shall register the applicant and, in respect of the applicant, the other particulars furnished under paragraph (1)(b) and shall, within 28 days of it being granted, confirm in writing (or in electronic form) that the applicant is registered with it.
(5) Where an application for registration is refused, SEPA shall give notice in writing (or in electronic form) of the refusal to the applicant within 28 days of the refusal; and the notice shall be accompanied by a statement of the reasons for the decision and as to the circumstances in which an offence under regulation 13(1) may be committed.
(6) Where SEPA fails to determine the application within 56 days of the date on which the application was made, the application shall be deemed to have been refused at the end of that period.

Cancellation of registration or particulars
7. (1) SEPA may cancel the registration with it of a holder where it appears to them that the applicant supplied false information in connection with that application for registration or has failed to comply with regulation 10(1) or (2) or a notice under regulation 10(4) (whether or not proceedings are instituted under regulation 13).
(2) SEPA shall cancel the registered particulars in respect of a particular location if it appears to them that the registered holder does not hold contaminated equipment there.
(3) Before any cancellation under paragraph (1) or (2) takes effect, SEPA shall, subject to paragraph (4), serve on the registered holder notice in writing (or in electronic form) of–
(a) its decision to cancel;
(b) the reasons for the decision; and
(c) the date when the cancellation will take effect, being not earlier than 28 days from the date of service of the notice.
(4) Nothing in paragraph (3) shall require SEPA to give notice of a cancellation which gives effect to information supplied by a registered holder pursuant to regulation 10(1) and (2) or a notice under regulation 10(4).

Appeals
8. (1) A person may, by notice given in writing (or in electronic form) to the Scottish Ministers, appeal to the Scottish Ministers against–
(a) the deemed refusal under regulation 6(6) of an application for registration; or
(b) the cancellation of a registration under regulation 7.
(2) An appeal–
(a) under paragraph (1)(a) shall be brought within the period of 28 days beginning with the day on which the application is deemed to be refused;
(b) under paragraph (1)(b) shall be brought before the date on which the cancellation takes effect.
(3) The provisions set out in section 114(1), (3)(a) and (4) of, and Schedule 20 to, the 1995 Act (concerning the delegation of functions of determining and the reference of matters involved in, appeals) shall apply in relation to appeals to the Scottish Ministers under this regulation, and matters involved in them, as they apply to appeals under the provisions specified in section 114(2)(a) of the 1995 Act and matters involved in those appeals.
(4) Where an appeal is made to the Scottish Ministers, if a party to the appeal so requests, or the Scottish Ministers so decide, the appeal shall be or continue in the form of a hearing (which may, if the person hearing the appeal so decides, be held or held to any extent in private).
(5) A person aggrieved by a decision of the Scottish Ministers under this regulation may, within 28 days of that decision, appeal to the sheriff by way of summary application.
(6) Where, on an appeal in a case falling within paragraph (1)(b), the person determining the appeal determines that the decision of SEPA shall be altered, it shall be the duty of SEPA to give effect to the determination on the date it becomes effective.
(7) While an appeal is pending in a case falling within paragraph (1)(b), the decision in question shall be ineffective; and the decision on the appeal shall become (or shall be treated as) effective 28 days after the day on which the appeal is decided or withdrawn, unless an appeal is taken to the sheriff in accordance with paragraph (5), in which case the decision shall become (or shall be treated as) effective from the expiry of the time period for any further appeal without any such further appeal being taken or, if there is no further right of appeal, the date of final disposal of the matter (or in either case the date of withdrawal of the appeal).

PART IV INVENTORIES OF CONTAMINATED EQUIPMENT

Inventories of contaminated equipment
9. (1) SEPA shall, on or before 30th September 2000, compile an inventory of the contaminated equipment held at every location in respect of which there is a registered holder.
(2) Subject to paragraph (3), an inventory compiled in accordance with paragraph (1) shall record–
(a) the name and address of the registered holder of the contaminated equipment;
(b) the location and description of the equipment;
(c) the quantity of PCBs contained in the equipment, in each case specifying (so far as reasonably practicable) the particular substance or mixture concerned;
(d) the dates and types of treatment or replacement carried out or envisaged; and
(e) the date of declaration.
(3) An inventory need not record information of the descriptions in paragraph (2)(c) and (d) as regards any equipment in respect of which it is reasonable to assume that the content of PCBs in the fluids is between 0.05% and 0.005%, by weight.
(4) SEPA shall, on or before 30th September 2000, send to the Scottish Ministers a summary of the inventories which it has compiled in accordance with paragraph (1); and the summary shall include a statement as to–
(a) the number of registered holders in Scotland; and
(b) the number of items of equipment of which particulars are registered.
(5) SEPA shall–
(a) on or before 30th September in each year after 2000, review the inventory which it has compiled in accordance with paragraph (1) or, as the case may be, the most recent revision of that inventory; and
(b) on or before 30th September in each year after 2000 provide the Scottish Ministers with a summary which shall include the total for the time being of –
(i) the number of registered holders in Scotland; and
(ii) the number of items of equipment of which particulars are registered.
(6) Paragraph (3) shall apply in respect of a review under paragraph (5)(a) as it applies to the compilation of the inventory.

Information for inventories
10. (1) A registered holder who (by virtue of paragraphs (2) to (3D) or (5) of regulation 4) intends to continue to hold contaminated equipment on or after 31st July in the year 2001 or in any subsequent year shall apply in writing (or in an electronic form acceptable to SEPA) in the relevant year, but before 31st July, for the registration to continue.
Words in reg. 10(1) substituted (14.2.2021) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(6)
(2) In so applying, the registered holder shall, in respect of each of the items of contaminated equipment held which have been, or are to be, included in an inventory compiled in accordance with regulation 9(1), notify SEPA of the locations and descriptions and, subject to regulation 9(3), the quantities and the dates and types of treatment, referred to in regulation 9(2).
(3) SEPA shall monitor the quantities of which they are notified under paragraph (2), and shall consider what, if any, changes to the registered particulars of the holder are required as a result of the notification.
(4) For the purpose of enabling SEPA to discharge the function referred to in paragraph (3), they may by notice in writing (or in electronic form) served on the registered holder of any equipment in respect of which a quantity has been notified in accordance with paragraph (2), require that person to provide, within such reasonable period as SEPA may specify in the notice, such information as they may reasonably require.

PART V MISCELLANEOUS

Information for the public
11. (1) Subject to paragraphs (5) and (6), SEPA shall make available for public inspection, without charge, and at all reasonable hours, a copy of every inventory and revised inventory which it has compiled.
(2) The copy may be kept in any form but shall be indexed and arranged so that members of the public can readily trace information recorded in it.
(3) Subject to paragraphs (5) and (7), SEPA shall keep a register specifying the quantity, origin, nature and PCB content of used PCBs in respect of which copies of consignment notes specifying that information are furnished to it under regulations 5(4), 8(7) or 9(3) of the Special Waste Regulations 1996 by a person in the course of a business concerned with the disposal of PCBs.
S.I. 1996/972, to which there are amendments not relevant to these Regulations.
(4) The register may be kept in any form and may, in particular, comprise copies, or extracts of copies, of consignment notes; but it shall be–
(a) indexed and arranged so that members of the public can readily trace information recorded in it; and
(b) made available for public inspection, without charge, at all reasonable hours.
(5) Nothing in paragraphs (1) or (3) shall require SEPA to make available information which–
(a) is capable of being, or must be, treated as confidential for the purposes of regulation 4 of the Environmental Information Regulations 1992 ; or
S.I. 1992/3240, amended by S.I. 1998/1447.
(b) would be capable of being, or would have to be, treated as confidential for those purposes if it were information to which those Regulations applied.
(6) Nothing in paragraph (1) shall require SEPA to retain an inventory or revised inventory, as the case may be, which has been superseded by a revised inventory once 4 years have elapsed from the date on which the revised inventory or the most recent revised inventory, as the case may be, was compiled.
(7) The register mentioned in paragraphs (3) and (4) shall be kept until the first date after 31st December 2010 on which there is no entry therein.
(8) Until the date on which the register need no longer be kept in terms of paragraph (7), paragraphs (4), (5) and (6) of regulation 9 shall apply to a register of the number of persons in the course of a business concerned with the disposal of PCBs and the matters specified at paragraph (3) as they apply to an inventory of contaminated equipment compiled under regulation 9(1).

Payment of charges
12. Where SEPA has fixed a charge under section 43 of the 1995 Act for a service or facility provided in the course of carrying out its functions in connection with these Regulations, the charge shall be paid–
(a) where the service or facility is provided in connection with an application, at the time when the application is made;
(b) in any other case, no later than the time when the service or facility is provided.

Offences and penalties
13. (1) A person who holds any contaminated equipment in contravention of regulation 3 is guilty of an offence.
(2) A person–
(a) who holds PCBs or equipment in contravention of regulation 4(1); or
(b) who, being the holder of PCBs or equipment to which regulation 4(2)(b) applies, fails to dispose of them in accordance with that sub-paragraph; or
(c) who, being the holder of equipment, fails to decontaminate or dispose of that equipment–
(ia) in a case to which regulation 4(3A) applies, as soon as possible after the end of its useful life,
Reg. 13(2)(c)(ia)(ib) substituted for reg. 13(2)(c)(i) (14.2.2021) by The Environmental Protection (Disposal of Polychlorinated Biphenyls and other Dangerous Substances) (Scotland) Amendment Regulations 2020 (S.S.I. 2020/434), regs. 1, 2(7)
(ib) in a case to which regulation 4(3C) applies, as soon as possible after 31 December 2025,
(ii) in a case to which regulation 4(5) applies, in accordance with paragraph (8) of that regulation;
(iii) in a case to which regulation 4(9) applies, as soon as possible after the end of the useful life of the other equipment of which it forms part,
is guilty of an offence.
(3) A holder of equipment who fails to comply with regulation 4(4)(d) or regulation 5 is guilty of an offence.
(4) A person who–
(a) supplies information in accordance with regulation 6(1) knowing it to be false or misleading in a material particular or recklessly supplies information which is false or misleading in a material particular;
(b) fails without reasonable excuse to supply information in accordance with regulation 10(2) or notice under regulation 10(4); or
(c) supplies such information knowing it to be false or misleading in a material particular or recklessly supplies information which is false or misleading in a material particular,
is guilty of an offence.
(5) A person guilty of an offence under paragraphs (1) or (2) shall be liable–
(a) on summary conviction, to a fine not exceeding the statutory maximum;
(b) on indictment, to a fine or a term of imprisonment not exceeding two years, or to both.
(6) A person guilty of an offence under paragraphs (3) or (4) shall be liable–
(a) on summary conviction, to a fine not exceeding the statutory maximum;
(b) on indictment, to a fine.
(7) Where an offence under any paragraph of this regulation committed by a body corporate or a partnership is proved to have been committed with the consent or connivance of, or to have been attributable to any neglect on the part of, any director, manager, secretary or other similar officer of the body corporate or a person who was purporting to act in any such capacity (or, in the case of a partnership, a partner or person who was purporting to act as a partner), such person as well as the body corporate or the partnership, as the case may be, shall be guilty of that offence and shall be liable to be proceeded against and punished accordingly.
(8) Where the affairs of a body corporate are managed by its members, paragraph (7) shall apply in relation to the acts or defaults of a member in connection with the functions of management of that member as if such member were a director of the body corporate.

Revocation of Regulations
14. (1) The Control of Pollution (Supply and Use of Injurious Substances) Regulations 1986 , as they extend to Scotland, are revoked, with effect from 1st January 2001.
S.I. 1986/902, amended by S.I. 1992/31.
(2) Regulation 2 (PCBs and PCTs) of the Environmental Protection (Controls on Injurious Substances) Regulations 1992 , as it extends to Scotland, is revoked, with effect from 1st January 2001.
S.I. 1992/31.
Sarah Boyack
A member of the Scottish Executive
St Andrew’s House, Edinburgh

SCHEDULE 1 DISPOSAL OPERATIONS D8, D9, D10, D12 AND D15 AS SET OUT IN PART II OF SCHEDULE 4 OF THE WASTE MANAGEMENT LICENSING (SCOTLAND) REGULATIONS 2011
Regulation 2

“D8 Biological treatment not specified elsewhere in this Annex which results in final compounds or mixtures which are discarded by means of any of the operations numbered D1 to D12.
D9 Physico-chemical treatment not specified elsewhere in this Annex which results in final compounds or mixtures which are discarded by means of any of the operations numbered D1 to D12 (e.g. evaporation, drying, calcination, etc.).
D10 Incineration on land.
D12 Permanent storage (e.g. emplacement of containers in a mine, etc.).
D15 Storage pending any of the operations numbered D1 to D14 (excluding temporary storage, pending collection, on the site where it is produced).”

.
Words in sch. 1 heading substituted (31.12.2020) by The Environment (EU Exit) (Scotland) (Amendment etc.) Regulations 2019 (S.S.I. 2019/26), regs. 1, 8(3); 2020 c. 1, Sch. 5 para. 1(1)

SCHEDULE 2 LABELLING OF DECONTAMINATED EQUIPMENT
Regulation 4(4)(d)

Each item of decontaminated equipment must be clearly marked with an indelible and embossed or engraved sign which must include the following information:–

“DECONTAMINATED PCB EQUIPMENT
Fluid containing PCBs was replaced
– with.................... (name of the substitute)
– on.................... (date)
– by.................... (undertaking).
Concentration of PCBs in
– old fluid.................... % by weight
– new fluid.................... % by weight.”.

(This note is not part of the Regulations)
These Regulations relate, in respect of Scotland, to Council Directive 96/59/EEC (“the Directive”) on the disposal of polychlorinated biphenyls and polychlorinated terphenyls (“PCBs”). They are made for the purpose of implementing the provisions of the Directive which require decontamination or disposal of PCBs and equipment containing them and the associated provisions for inventories, labelling and monitoring. They are additional to the existing relevant requirements of the waste management licensing regime under the Environmental Protection Act 1990.
Subject to exceptions in particular for businesses concerned with the decontamination and disposal of PCBs, regulation 3 prohibits the holding in Scotland of certain equipment contaminated by PCBs (“contaminated equipment”) by anyone other than a person registered with the Scottish Environment Protection Agency (“SEPA”) under these Regulations. This prohibition applies after 31st July 2000.
Subject to similar exceptions and to exceptions for transformers and for certain other equipment being replaced under major replacement programmes, regulation 4(1) prohibits the holding of PCBs and equipment containing them (whether or not within the definition of “contaminated equipment” in regulation 2). This provision applies even though a person is registered with SEPA, but applies only after 31st December 2000.
Contaminated equipment is to be labelled as such (regulation 5) and, when decontaminated, within specified limits, is to be re-labelled in the form set out in Schedule 2 to the Regulations (regulation 4(4)(d)).
Regulation 6 provides for the procedure for registration. Applicants for registration are required to specify, amongst other things, the date by which they expect to have decontaminated or disposed of the equipment concerned. Regulation 7 provides for cancellation of the registration and regulation 8 for appeals against the non-determination of an application for registration or the cancellation of a registration.
Registered holders are required to provide information to SEPA on a regular basis (regulation 10).
Regulations 9, 10(3) and 11 set out the duties of SEPA to monitor the information supplied, to prepare an inventory for submission to the Scottish Ministers, to review the inventory at regular intervals, to provide an annual statement of the number of registered holders and items of equipment of which particulars are registered and in relation to a public register. The preparation of inventories by SEPA and the provision of summaries to the Scottish Ministers will facilitate the discharge of the obligation imposed by Article 4.1 of the Directive to send to the Commission a summary of the inventories of equipment with PCB volumes of more than 5dm3. SEPA also obtains other relevant information through the system of consignment notes under the Special Waste Regulations 1996. SEPA is required by regulation 11(8) of these Regulations to provide an annual statement to the Scottish Ministers setting out the number of registered holders of such notes and the amount of equipment held.
Regulation 12 provides for payment of charges; regulation 13 creates certain criminal offences; and regulation 14 provides for revocations.
Schedule 1 to the Regulations records the disposal operations D8 to D10, D12 and D15 set out in Annex IIA of Directive 75/442/EEC on waste, as replaced by Council Decision 96/350 and Schedule 2 sets out the Directive’s requirements for the labelling of decontaminated equipment.
A regulatory impact assessment which indicates the cost of compliance to business in respect of these Regulations may be obtained from the Scottish Executive, Environment Protection Unit at Victoria Quay Edinburgh EH6 6QQ. A copy has been made available in the Parliament’s reference centre. Additional copies are available in the document supply centre.