Square mesh panel requirements
4. Any net to which this article applies which has a mesh size of 70 millimetres or more but less than 119 millimetres shall have incorporated in it as part of the net a square mesh panel which–
(a) has a mesh size of not less than 90 millimetres; and
(b) is positioned so that the rearmost row of meshes of the square mesh panel is no more than 9 metres from the codline or, in any case where the net is carried in or used by a boat for the purpose of fishing for Norway lobsters, the rearmost row of meshes of the square mesh panel shall be no more than 15 metres from the codline.
Art. 4(b) substituted (1.8.2001) by The Sea Fish (Specified Sea Areas) (Regulation of Nets and Other Fishing Gear) (Scotland) Amendment Order 2001 (S.S.I. 2001/250), arts. 1(1), 4

Art. 4 in force at 3.8.2000, see art. 1(2)