PART IV STANDARD RULES

37 Standard rules: conditions
1 SEPA may specify in a permit for a standard installation or standard mobile plant that standard rules are to be conditions of the permit (“a standard rules condition”).
2 A reference in a permit to standard rules is to the rules as revised from time to time.
3 A standard rules condition may be combined with any other condition under Part III of these Regulations.
4 If a standard rules condition is inconsistent with any other condition of a permit, the standard rules condition shall prevail to the extent of that inconsistency.
5 If an installation or mobile plant becomes a standard installation or standard mobile plant, SEPA may vary the permit for the installation or plant so as to include a standard rules condition.