EXPLANATORY NOTE
(This note is not part of the Regulations)
These Regulations amend the Taxis (Taximeters, Devices and Maximum Fares) Regulations (Northern Ireland) 2015 in order to increase the fee payable for the inspection, testing and sealing of an approved taximeter and device from £35.00 to £42.00.
An Explanatory Memorandum and Regulatory Impact Assessment have been produced and are available from Safe and Accessible Travel Division, Department for Infrastructure, Clarence Court, 10-18 Adelaide Street, Town Parks, Belfast BT2 8GB or online alongside this Regulation at http//www.legislation.gov.uk/nisr