9 Outline planning zone
1 The outline planning zone shall be determined by the Executive following discussion with the operator
2 The operator and the Executive may agree that the site has no outline planning zone.
3 The planning to be arranged by the Executive in relation to the outline planning zone shall be commensurate to the risk of a radiation emergency affecting that area, and the off-site emergency plan required under regulation 11 shall clearly set out when that plan would be brought into effect in relation to the outline planning zone.