SCHEDULE Revocations
Regulation 3
Column (1)	Column (2)	Column (3)
Citation	Reference	Extent of revocation
The Social Security (Industrial Injuries) (Prescribed Diseases) (Amendment) Regulations (Northern Ireland) 1993	S.R. 1993 No. 148	Regulation 3
The Social Security (Industrial Injuries) (Prescribed Diseases) (Amendment No. 2) Regulations (Northern Ireland) 1993	S.R. 1993 No. 350	Regulation 3
The Social Security (Industrial Injuries and Diseases) (Miscellaneous Amendment) Regulations (Northern Ireland) 1996	S.R. 1996 No. 57	Regulation 3(2)
The Social Security (Industrial Injuries) (Prescribed Diseases) (Amendment) Regulations (Northern Ireland) 2003	S.R. 2003 No. 63	Regulation 2(2)
The Social Security (Industrial Injuries) (Prescribed Diseases) (Amendment) Regulations (Northern Ireland) 2006	S.R. 2006 No. 96	Regulation 2(3)