SCHEDULE 4 Conditions to which the exemptions from Article 8(1)(bb) of the Electricity Order are subject

Closed distribution systems
12 (1) Paragraph 5(1) to (8) does not apply in relation to any use of system charge (or proposed use of system charge) that relates to a closed distribution system.
(2) Where a distribution exemption holder that operates or has control of a closed distribution system receives an expression of interest from a customer who owns or occupies premises that are connected to that system, it must—
(a) include in any notice served under paragraph 1(4) a statement that its distribution system is a closed distribution system; and
(b) within 7 working days beginning with the day on which it receives the expression of interest, by notice inform any third party supplier identified in the expression of interest that its distribution system is a closed distribution system.