Composition of the Scrutiny Committee
3
1
The Scrutiny Committee is to consist of—
a
a lay member who is the chair;
b
a lay member who is the deputy chair;
c
2 other lay members; and
d
4 members who are registered persons
all of whom shall be appointed by the Council.
2
The quorum of the Scrutiny Committee shall be 3 which must include—
a
the chair or a deputy chair;
b
a lay member; and
c
a member who is a registered person.
3
The chair and deputy chair referred to in paragraph (1)(a) and (b) may be legally qualified.
4
In the absence of the chair of the Scrutiny Committee at a meeting the deputy chair may perform the functions of the chair.
5
The Council may remove any member of the Scrutiny Committee from office for inability to perform their duties or for misbehaviour.