1 Citation, commencement and interpretation
1 These Regulations may be cited as the Smoke Control Areas (Exempted Fireplaces) (Amendment) Regulations (Northern Ireland) 2008 and shall come into operation on 4th August 2008.
2 In these Regulations “the Principal Regulations” means the Smoke Control Areas (Exempted Fireplaces) Regulations (Northern Ireland) 1999.
S.R. 1999 No. 289 as amended by S.R. 2001 No. 211, S.R. 2003 No. 343 and S.R. 2007 No. 308