SCHEDULE 2 BATHING WATER PROFILES

2 Review
(1) Where a bathing water is classified as “poor”, “sufficient” or “good” under regulation 12, the Department shall review the bathing water profile—
(a) at the following minimum frequency—
(i) for a “poor” classification, every two years;
(ii) for a “sufficient classification”, every three years; and
(iii) for a “good” classification, every four years; and
(b) taking into account the nature and severity of the pollution which affects the bathing water.
(2) Where there are significant construction works or infrastructure changes in or around a bathing water, the Department shall review the bathing water profile before the start of the next bathing season.