. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (25.1.2010) by The Official Feed and Food Controls Regulations (Northern Ireland) 2009 (S.R. 2009/427), regs. 1, 47(b)