1 Citation and commencement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (31.10.2012) by The Building Regulations (Northern Ireland) 2012 (S.R. 2012/192), regs. 1, 21 (with regs. 3(2), 4)

2 Interpretation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Application of certain regulations to existing buildings
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Transitional provisions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 Amendment of the principal Regulations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Amendment of Part A (Interpretation and general)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7 Amendment of Part B (Materials and workmanship)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8 Substitution of Part F (Conservation of fuel and power)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9 Substitution of Part L (Heat-producing appliances and liquefied petroleum gas installations)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10 Substitution of Part R (Access and facilities for disabled people)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11 Amendment of Part V (Glazing)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

12 Amendment of Schedule 1 (Classes of exempted buildings — Regulation A5(1))
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

13 Amendment of Schedule 2
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

14 Amendment of Schedule 5 (Deemed-to-satisfy provisions)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

15 Amendment of Schedule 6
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .