SCHEDULE 4 CONFORMITY ASSESSMENT PROCEDURES
(This Schedule substantially reproduces the provisions of Part 1 of Annex IV of the Transportable Pressure Equipment Directive.)

7 Module B1—EC design examination
Each notified body must communicate to the member States the relevant information concerning the EC design-examination certificates which it has withdrawn, and, on request, those it has issued.
Each notified body must also communicate to the other notified bodies the relevant information concerning the EC design-examination certificates it has withdrawn or refused.