. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (1.7.2009) by The Domestic Energy Efficiency Grants Regulations (Northern Ireland) 2009 (S.R. 2009/195), reg. 1, Sch.