SCHEDULE Air Quality Objectives

2 Interpretation
(1) A running annual mean is a mean, which is calculated on an hourly basis, yielding one running annual mean per hour. The running annual mean for a particular substance at a particular location for a particular hour is the mean of the hourly levels for that substance at that location for that hour and the preceding 8759 hours.
(2) For the purpose of the calculation of a running annual mean, the hourly level for a particular substance at a particular location is either –
(a) the level at which that substance is recorded as being present in the air at that location during the hour on the basis of a continuous sample of air taken during that hour for at least 30 minutes: or
(b) the mean of the levels recorded at that location on the basis of 2 or more samples of air taken during the hour for an aggregate period of at least 30 minutes.