2002 No. 56

ENERGY CONSERVATION

The Domestic Energy Efficiency Grants Regulations (Northern Ireland) 2002 (revoked)
Made
19th February 2002
Coming into operation
1st April 2002
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Citation and commencement
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Powers of the Department
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Persons who may apply for a grant
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Purposes for which grant may be approved
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Maximum amount of grant
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Applications for grant
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Revocation and transitional provisions
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (1.7.2009) by The Domestic Energy Efficiency Grants Regulations (Northern Ireland) 2009 (S.R. 2009/195), reg. 1, Sch. (with reg. 8(2))