SCHEDULE 7 Information to be included in Emergency Plans

Part III Information to be included in an off-site emergency plan
The information referred to in regulation 9(3) is as follows:—
(a) the names or positions of persons authorised to set emergency procedures in motion and of persons authorised to take charge of and co-ordinate the off-site mitigatory action;
(b) the arrangements for receiving early warning of incidents, and alert and call-out procedures;
(c) the arrangements for co-ordinating resources necessary to implement the off-site emergency plan;
(d) the arrangements for providing assistance with on-site mitigatory action;
(e) the arrangements for off-site mitigatory action;
(f) the arrangements for providing the public with specific information relating to the emergency and the behaviour which it should adopt; and
(g) the arrangements for emergency exposures including the dose levels which have been determined as appropriate for the purposes of putting into effect the emergency plan.