SCHEDULE 6 Further Particulars that the Executive may require
Regulation 6(5)
A further assessment and report may be required under regulation 6(5) in respect of the following matters:—
(a) the analysis carried out to establish the likely consequences of any hazard, including the likely doses of ionising radiation to which members of the public might be exposed, and the probability of the occurrence of such hazard;
(b) the number of persons whose health or safety might be affected by the hazard;
(c) the management systems and staffing arrangements by which any hazard is to be or is controlled;
(d) the safety systems, procedures and monitoring systems by which any hazard is to be or is controlled;
(e) the qualifications, experience and training of staff concerned;
(f) the design, construction, operation or maintenance of any equipment (including the incorporation of adequate safety or reliability features of such equipment) which is used for the purposes of intervention or which is used to control any hazard;
(g) the design and operating documentation;
(h) the design and operation of containment and pressure systems;
(i) the protection of persons from the effects of loss of containment; and
(j) the procedures for the reporting of and learning from radiation emergencies.