. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (3.5.2006) by The Transmissible Spongiform Encephalopathies Regulations (Northern Ireland) 2006 (S.R. 2006/202), regs. 1, 20, Sch. 8