3 Substitution of Schedule 1 to the principal Regulations
For Schedule 1 to the principal Regulations (table of rates of lesser incapacity allowance for beneficiaries to whom regulation 5(2) applies and table of loss of earnings and corresponding rates of lesser incapacity allowance) there shall be substituted the Schedule set out in the Schedule to these Regulations.