Statutory Rules of Northern Ireland
2000 No. 261
HEALTH AND SAFETY
INDUSTRIAL RELATIONS
INDUSTRIAL TRAINING
Industrial Tribunals (Constitution and Rules of Procedure) (Amendment) Regulations (Northern Ireland) 2000 (revoked)
Regulations revoked (4.4.2004) by Industrial Tribunals (Constitution and Rules of Procedure) Regulations (Northern Ireland) 2004 (S.R. 2004/165), regs. 1(2), 14, Sch. 7 (with reg. 13)
Made 23rd August 2000
Coming into operation 1st October 2000

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Citation, commencement and interpretation
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of regulation 7 of the Principal Regulations
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of rule 2 of Schedule 1
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of rule 8 of Schedule 1
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of rule 5 of Schedule 3
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of rule 3 of Schedule 4
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of rule 4 of Schedule 4
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment of rule 2 of Schedule 5
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transitional Provision
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .