. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (1.6.2015) by The Health and Safety (Miscellaneous Repeals, Revocations and Amendments) Regulations (Northern Ireland) 2015 (S.R. 2015/223), reg. 1(1), Sch. Table 2