SCHEDULE 5
Part II

Requirements for Storage Centre
Regulations 2 and 9
The storage centre shall treat and disinfect all water which leaves the storage centre so as to prevent any contamination of the host environment.
Regulations revoked (27.3.2009) by The Aquatic Animal Health Regulations (Northern Ireland) 2009 (S.R. 2009/129), reg. 1(1), Sch. 2;
[Editorial note: No historical revised versions have been created for amendments to the S.R. made prior to its final revocation. A revised version of how the S.R. stood at its firsr commencement is available and, to see the dcoument content as it orginally stood when it was made, select the 'original (As Made)' version form the left-hand menu. For further details of the amendments see the List of All Changes available in 'More Resources' above}