SCHEDULE 4

Overall and Specific Migration Testing Using Food Simulants
Part III

Selection of Food Simulants
D.

Selection of simulants for testing materials or articles which are accompanied by a specific indication
6
The simulant or simulants to be used in testing a plastic material or article which, pursuant to regulation 7 or 8, as appropriate, of the 1987 Regulations, is accompanied by a specific indication stating any type or types of food described in Table 1 with which it may or may not be used shall be the simulant or simulants in column 2 of Table 2 to this Part opposite the contact food in column 1 of that Table which corresponds most closely to the type or type of food with which it may be used, as identified by the indication which accompanies the plastic material or article.
Sch. 4 Pt. III(crossheading)(selection)(of)(simulants)(for)(testing)(materials)(or)(articles)(which)(are)(accompanied)(by)(a)(specific)(indication_paragraph)(6) in operation at 14.9.1998, see reg. 1