PART II

ELECTRICITY SUPPLY

Supply by public electricity suppliers

Duty to connect on request
19
1
An electricity distributor is under a duty—
a
to make a connection between a distribution system of his and any premises, when required to do so by—
i
the owner or occupier of the premises; or
ii
an electricity supplier or person supplying electricity under an exemption acting with the consent of the owner or occupier of the premises, for the purpose of enabling electricity to be conveyed to or from the premises;
b
to make a connection between a distribution system of his and any distribution system of another electricity distributor, when required to do so by that distributor for the purpose of enabling electricity to be conveyed to or from that other system.
2
Any duty under paragraph (1) includes a duty to provide such electric lines or electrical plant as may be necessary to enable the connection to be used for the purpose for which it is required.
3
The duties under this Article shall be performed subject to such terms as may be agreed under Article 20 for so long as the connection is required.
4
In this Article and Articles 20 to 26—
a
any reference to making a connection includes a reference to maintaining the connection (and continuing to provide the necessary electric lines or electrical plant);
b
any reference to requiring a connection includes a reference to requiring the connection to be maintained (and the continued provision of the necessary electric lines and electrical plant); and
c
any reference to the provision of any electric line or electrical plant is a reference to the provision of such a line or an item of electrical plant either by the installation of a new one or by the modification of an existing one.
5
The duties under this Article are subject to the following provisions of this Part and any regulations made under those provisions.
Arts. 19-26 substituted (1.11.2007) by Electricity Regulations (Northern Ireland) 2007 (S.R. 2007/321), regs. 1(2), 9 (with transitional provisions in Pt. IV)