1988 No. 1844 (N.I. 14)
The Corneal Tissue (Northern Ireland) Order 1988 (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Order repealed (1.9.2006) by Human Tissue Act 2004 (c. 30), ss. 57, 60(2)(4), Sch. 7; S.I. 2006/1997, art. 3(2) (with transitional provisions in arts. 4, 7, 8 (as amended (5.8.2006) by S.I. 2006/2169, art. 2))