PART 15

SUPPLEMENTARY

Provision of information and facilities

Provision of facilities by HSC trusts and the Department
291
1
An HSC trust must provide to a relevant authority such facilities as are necessary to enable the relevant authority to perform its functions under this Act.
2
In subsection (1) “relevant authority” means—
a
the High Court;
b
the Public Guardian; or
c
the Tribunal.
3
The Department must provide, to the Tribunal, such facilities as are necessary to enable the Tribunal to perform its functions under this Act.
S. 291(1)(2)(a)(c)(3) in operation at 2.12.2019 for specified purposes by S.R. 2019/163, art. 2(4), Sch. Pt. 4 (with art. 3) (as amended by S.R. 2019/190, art. 2)