PART 4

CONTROLLED RESERVOIRS: OTHER REQUIREMENTS

Display of emergency response information
59
1
The reservoir manager of a controlled reservoir must ensure that emergency response information is displayed at or near the reservoir.
2
Emergency response information is such information about the reservoir and the reservoir manager as may be specified by regulations by the Department.
3
The information that may be specified under subsection (2) includes in particular—
a
the name of the reservoir (if any),
b
any registration number in the controlled reservoirs register in respect of the reservoir,
c
the reservoir manager's name and address and information for the purpose of enabling a person to contact the reservoir manager in the event of an emergency,
d
where the reservoir is a high-consequence reservoir or medium-consequence reservoir, information for the purpose of enabling a person to contact the Department in the event of an emergency.
4
The Department may by notice served on reservoir managers of controlled reservoirs give them directions to as to—
a
the manner in which emergency response information is to be displayed,
b
each location at which it is to be displayed.
5
Directions under subsection (4) may be general or specific.
6
The reservoir manager of a controlled reservoir must comply with any direction by the Department under subsection (4).