Part 14

Miscellaneous and general provisions

Review of Act

Review of Act
228
1
The Department must—
a
not later than 3 years after the commencement of Part 3 of this Act, and
b
at least once in every period of 5 years thereafter,
review and publish a report on the implementation of this Act.
2
Regulations under this section shall set out the terms of the review.
S. 228 in operation at 13.2.2015 for specified purposes by S.R. 2015/49, art. 2, Sch. 1
S. 228 in operation at 1.4.2015 in so far as not already in operation by S.R. 2015/49, art. 3, Sch. 1 (with Sch. 2) (as amended (16.3.2016) by S.R. 2016/159, art. 2)
Ss. 228-235: transfer of functions (8.5.2016) by The Departments (Transfer of Functions) Order (Northern Ireland) 2016 (S.R. 2016/76), art. 1(2), Sch. 5 Pt. 2 (with art. 9(2))