PART 2

REGISTERED SOCIAL LANDLORDS
CHAPTER 3

REGULATION

Inspection

Inspection
44
After paragraph 19B of Schedule 1 to the Housing Act 1996 insert—

Inspection
19C
1
The Welsh Ministers—
a
may inspect a registered social landlord's affairs, or
b
may arrange for another person to do so.
2
An inspection may be general or specific.
3
If the Welsh Ministers arrange for a person to carry out an inspection, they may direct that person to discontinue it.
4
If the Welsh Ministers arrange for a person to carry out an inspection, the arrangements may include (among other things) provision about payments.
S. 44 in force at 18.10.2011 by S.I. 2011/2475, arts. 1(2), 2(g)