Domestic Fire Safety (Wales) Measure 2011 (repealed)
2011 nawm 3
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Requirement to provide automatic fire suppression systems
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Enforcement
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Provision of information
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Authentication and service of documents
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Prosecution of offences
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transitional and consequential provision etc
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Regulations and orders
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Short title and commencement
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE 1

ENFORCEMENT
(as introduced by section 2)

Penalty for contravening section 1(1)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Time limit for prosecution
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Alteration of offending work
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Obtaining of report where paragraph 3 notice given
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appeal against a paragraph 3 notice
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Power to enter premises
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Tests for conformity with the requirements of this Measure
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Compensation for damage
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Procedure on appeal or application
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Obstruction
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE 2

BUILDING WORK SUPERVISED OTHERWISE THAN BY LOCAL AUTHORITIES
(as introduced by section 2)

Effect of initial notice under Part 2 of the 1984 Act
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Effect of public body's notice under Part 2 of the 1984 Act
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Measure repealed (10.9.2025) by Legislation (Procedure, Publication and Repeals) (Wales) Act 2025 (asc 3), s. 9(2)(d), Sch. 1 para. 26