Domestic Fire Safety (Wales) Measure 2011 (repealed)
1
Requirement to provide automatic fire suppression systems
2
Enforcement
3
Provision of information
4
Authentication and service of documents
5
Prosecution of offences
6
Interpretation
7
Transitional and consequential provision etc
8
Regulations and orders
9
Short title and commencement
SCHEDULE 1
ENFORCEMENT
Penalty for contravening section 1(1)
1
A person who carries out building work which fails, at...
Time limit for prosecution
2
(1) Despite anything in section 127(1) of the Magistrates' Court...
Alteration of offending work
3
(1) If any building work to which this Measure applies...
Obtaining of report where paragraph 3 notice given
4
(1) In a case where— (a) a person to whom...
Appeal against a paragraph 3 notice
5
(1) A person who is given a paragraph 3 notice...
Power to enter premises
6
(1) Subject to this paragraph an authorised officer of a...
Tests for conformity with the requirements of this Measure
7
(1) This paragraph has effect for the purpose of enabling...
Compensation for damage
8
(1) A local authority must make full compensation to a...
Procedure on appeal or application
9
(1) This paragraph applies to— (a) an appeal to the...
Obstruction
10
A person who wilfully obstructs a person acting in the...
SCHEDULE 2
BUILDING WORK SUPERVISED OTHERWISE THAN BY LOCAL AUTHORITIES
Effect of initial notice under Part 2 of the 1984 Act
1
(1) This paragraph applies where an initial notice is in...
Effect of public body's notice under Part 2 of the 1984 Act
2
(1) Where a public body's notice is in force and...

Domestic Fire Safety (Wales) Measure 2011 (repealed)
2011 nawm 3
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Measure repealed (10.9.2025) by Legislation (Procedure, Publication and Repeals) (Wales) Act 2025 (asc 3), s. 9(2)(d), Sch. 1 para. 26