PART 2

THE WELSH LANGUAGE COMMISSIONER

Annual reports

Annual reports
18
1
The Commissioner must produce a report in relation to each financial year of the Commissioner (an “annual report”).
2
An annual report must include the following matters—
a
a summary of the action taken in the exercise of the Commissioner’s functions;
b
a review of issues relevant to the Welsh language;
c
a summary of the Commissioner’s work programme;
d
the Commissioner’s proposals for a work programme for the following financial year;
e
a summary of the complaints made in accordance with the procedure established under section 14.
3
An annual report may also include any other matters which the Commissioner thinks it appropriate to include in such a report.
4
For provision about the Commissioner’s financial year, see paragraph 15 of Schedule 1.