PART ONE

COMMON PROVISIONS

Access to networks, information systems and databases
Article 8
Unless otherwise provided in this Agreement, at the end of the transition period the United Kingdom shall cease to be entitled to access any network, any information system and any database established on the basis of Union law. The United Kingdom shall take appropriate measures to ensure that it does not access a network, information system or database which it is no longer entitled to access.