TITLE II

PROVISIONS FOR THE ENCOURAGEMENT OF PROGRESS IN THE FIELD OF NUCLEAR ENERGY
CHAPTER 9

The nuclear common market
Article 99
The Commission may make any recommendations for facilitating movements of capital intended to finance the industrial activities listed in Annex II to this Treaty.