TITLE II

PROVISIONS FOR THE ENCOURAGEMENT OF PROGRESS IN THE FIELD OF NUCLEAR ENERGY
CHAPTER 7

Safeguards
Article 80
The Commission may require that any excess special fissile materials recovered or obtained as by products and not actually being used or ready for use shall be deposited with the Agency or in other stores which are or can be supervised by the Commission.
Special fissile materials deposited in this way must be returned forthwith to those concerned at their request.