TITLE II

PROVISIONS FOR THE ENCOURAGEMENT OF PROGRESS IN THE FIELD OF NUCLEAR ENERGY
CHAPTER 7

Safeguards
Article 78
Anyone setting up or operating an installation for the production, separation or other use of source materials or special fissile materials or for the processing of irradiated nuclear fuels shall declare to the Commission the basic technical characteristics of the installations, to the extent that knowledge of these characteristics is necessary for the attainment of the objectives set out in Article 77.
The Commission must approve the techniques to be used for the chemical processing of irradiated materials, to the extent necessary to attain the objectives set out in Article 77.