PART VII INSTITUTIONAL PROVISIONS

CHAPTER 4 SAFEGUARD MEASURES
Article 113 1. A Contracting Party which is considering taking safeguard measures under Article 112 shall, without delay, notify the other Contracting Parties through the EEA Joint Committee and shall provide all relevant information.
2. The Contracting Parties shall immediately enter into consultations in the EEA Joint Committee with a view to finding a commonly acceptable solution.
3. The Contracting Party concerned may not take safeguard measures until one month has elapsed after the date of notification under paragraph 1, unless the consultation procedure under paragraph 2 has been concluded before the expiration of the stated time-limit. When exceptional circumstances requiring immediate action exclude prior examination, the Contracting Party concerned may apply forthwith the protective measures strictly necessary to remedy the situation.
For the Community, the safeguard measures shall be taken by the EC Commission.
4. The Contracting Party concerned shall, without delay, notify the measures taken to the EEA Joint Committee and shall provide all relevant information.
5. The safeguard measures taken shall be the subject of consultations in the EEA Joint Committee every three months from the date of their adoption with a view to their abolition before the date of expiry envisaged, or to the limitation of their scope of application.
Each Contracting Party may at any time request the EEA Joint Committee to review such measures.