ANNEX

B. Requirements of European standard referred to in Article 3(1)
1. Deployment of small-area wireless access points shall be in accordance with the installation classes E0, E2 and E10 of Table 2 of clause 6.2.4 of the European standard EN 62232:2017 ‘Determination of RF field strength, power density and specific absorption rate (SAR) in the vicinity of radiocommunication base stations for the purpose of evaluating human exposure’.