CHAPTER VI

MANUFACTURING, IMPORT AND EXPORT

Record keeping
Article 96
1
The holder of a manufacturing authorisation shall record the following information in respect of all veterinary medicinal products that it supplies:
a
date of the transaction;
b
name of the veterinary medicinal product, and marketing authorisation number if applicable, as well as pharmaceutical form and strength, as appropriate;
c
quantity supplied;
d
name or company name and permanent address or registered place of business of the recipient;
e
batch number;
f
date of expiry.
2
The records referred to in paragraph 1 shall be available for inspection by competent authorities for one year after the date of expiry of the batch or at least five years from recording, whichever is longer.