CHAPTER I

SUBJECT MATTER, SCOPE AND DEFINITIONS

Subject matter
Article 1
This Regulation lays down rules for the placing on the market, manufacturing, import, export, supply, distribution, pharmacovigilance, control and use of veterinary medicinal products.