Commission Regulation (EU) 2019/424
of 15 March 2019
laying down ecodesign requirements for servers and data storage products pursuant to Directive 2009/125/EC of the European Parliament and of the Council and amending Commission Regulation (EU) No 617/2013
(Text with EEA relevance)
THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Directive 2009/125/EC of the European Parliament and of the Council of 21 October 2009 establishing a framework for the setting of ecodesign requirements for energy-related products , and in particular Article 15(1) thereof,
After consulting the Consultation Forum referred to in Article 18 of Directive 2009/125/EC,
Whereas:
(1)
Directive 2009/125/EC requires the Commission to set ecodesign requirements for energy-related products that represent significant volumes of sales and trade, that have a significant environmental impact and that present significant potential for improvement in terms of their environmental impact without entailing excessive costs.
(2)
The Commission has carried out a preparatory study to analyse the technical, environmental and economic aspects of servers and data storage products typically used for commercial purposes. The study has been carried out with stakeholders and interested parties from the Union and third countries, and the results have been made publicly available.
(3)
Servers and data storage products are typically placed on the market for use in data centres, office and corporate environments.
(4)
The environmental aspects of servers and data storage products that have been identified as significant for the purposes of this Regulation are energy consumption in the use phase and resource efficiency, in particular on the aspects related to reparability, reusability, upgradeability and recyclability for security of supply.
(5)
Ecodesign requirements should harmonise energy consumption and resource efficiency requirements for servers and data storage products throughout the Union, for the internal market to operate better and in order to improve the environmental performance of those products.
(6)
The annual energy consumption related to servers directly is expected to be 48 TWh in 2030, which increases to 75 TWh when the annual energy consumption related to infrastructure (e.g. cooling systems and uninterruptible power supply systems) is also included. The annual energy consumption of data storage products is expected to be 30 TWh in 2030, 47 TWh when infrastructure is also included. The preparatory study shows that use-phase energy consumption by servers and data storage products can be significantly reduced.
(7)
The effect of the ecodesign requirements set out in this Regulation is estimated to result by 2030 in annual energy savings of approximately 9 TWh (approximately the yearly electricity consumption of Estonia in 2014). More in detail, the effect of the ecodesign requirements for servers set out in this Regulation is estimated to result by 2030 in direct annual energy savings of approximately 2,4 TWh and indirect (i.e. related to infrastructure) annual energy savings of 3,7 TWh, summing up to a total saving of 6,1 TWh, corresponding to a total of 2,1 Mt of CO2 equivalent. The effect of the ecodesign requirements for data storage products set out in this Regulation is estimated to result by 2030 in direct annual energy savings of approximately 0,8 TWh and indirect (i.e. related to infrastructure) annual energy savings of 2 TWh, summing up to a total saving of 2,8 TWh, corresponding to 0,9 Mt of CO2 equivalent.
(8)
In accordance with the Union action plan for the Circular Economy the Commission should make sure that special emphasis is placed on aspects relevant to the circular economy, such as durability and reparability, when setting out or revising ecodesign criteria. Therefore requirements should be laid down on non-energy related aspects, including extraction of key-components and of critical raw materials (CRMs), availability of functionality for secure data deletion and provision of latest available version of firmware.
(9)
The requirement on the extraction of key-components is expected to foster the reparability and upgradability of servers and data storage products, in particular by third parties (such as spare parts repairers and maintenance).
(10)
The possibility to address CRMs in Ecodesign regulations (including for enterprise servers) has been mentioned in the recent Commission Staff Working Document ‘Report on Critical Raw Materials and the Circular Economy’ .
(11)
The requirement on a functionality for secure data deletion could be implemented by means of technical solutions such as, but not limited to, a functionality implemented in firmware, typically in the Basic Input/Output System (BIOS), in software included in a self-contained bootable environment provided in a bootable compact disc, digital versatile disc or universal serial bus memory storage device included with the product, or in software installable in the supported operating systems provided with the product.
(12)
The requirements on non-energy related aspects are expected to contribute prolonging the lifetime of servers by making it easier to refurbish and reuse them, while maintaining compliance with the principles of privacy and protection of personal data as set by Regulation (EU) 2016/679 of the European Parliament and of the Council .
(13)
The energy consumption of servers and data storage products could be reduced by applying existing non-proprietary technologies without an increase in the combined costs of purchasing and operating these products.
(14)
The ecodesign requirements should not affect the functionality or affordability of servers and data storage products from the end-user's perspective and should not negatively affect health, safety or the environment.
(15)
This Regulation should apply without prejudice to the requirements of Union legislation on safety and health, in particular the Directive 2014/35/EU of the European Parliament and of the Council , which covers all health and safety risks of electrical equipment operating with a voltage between 50 and 1000 V for alternating current and between 75 and 1500 V for direct current.
(16)
The introduction of ecodesign requirements should give manufacturers sufficient time to redesign their products subject to this Regulation. The timing should take into account the impact on manufacturers' costs, in particular for small and medium-sized enterprises, while ensuring timely achievement of the objectives of this Regulation.
(17)
Product parameters should be measured and calculated using reliable, accurate and reproducible methods which take into account recognised state-of-the-art measurement and calculation methods, including, where available, harmonised standards adopted by the European standardisation organisations following a request by the Commission, in accordance with the procedures laid down in Regulation (EU) No 1025/2012 of the European Parliament and of the Council .
(18)
In accordance with Article 8 of Directive 2009/125/EC, this Regulation specifies which conformity assessment procedures apply.
(19)
In order to facilitate compliance checks, manufacturers should provide the information contained in the technical documentation referred to in Annexes IV and V to Directive 2009/125/EC insofar as that information relates to the requirements laid down in this Regulation.
(20)
In addition to the legally binding requirements laid down in this Regulation, indicative benchmarks for best available technologies should be determined to ensure that information on the life-cycle environmental performance of servers and data storage products is widely available and easily accessible.
(21)
Commission Regulation (EU) No 617/2013 should be amended to exclude computer servers from its scope in order to prevent any overlap with the same products in the scope of this Regulation.
(22)
The definitions of this Regulation related to data storage products are consistent with the terminology developed by the Storage Networking Industry Association (SNIA) Green Storage Initiative as defined in the SNIA Emerald taxonomy.
(23)
In particular, the small data storage products definition corresponds to the online 1 equipment as set out in the SNIA Emerald taxonomy, and the large data storage products definition corresponds to the online 5 and 6 equipment as set out in the SNIA Emerald taxonomy.
(24)
The definitions of this Regulation related to server product types, server efficiency, server performance and maximum power, are consistent with the terminology adopted in EN 303 470:2018. The measurement and calculation methods for the server efficiency are consistent with the methods adopted in EN 303 470:2018.
(25)
The operating conditions classes, and their characteristics, are consistent with the classification set in the Thermal Guidelines for Data Processing Environments by the American Society of Heating, Refrigerating and Air-Conditioning Engineers. In particular, the boundary conditions of each operating condition class (such as temperature and humidity) are in accord with the allowable environmental ranges of the Thermal Guidelines for Data Processing Environments, where manufacturers test their equipment in order to verify that it will function within those boundaries.
(26)
The measures provided for in this Regulation are in accordance with the opinion of the Committee established under Article 19(1) of Directive 2009/125/EC,
HAS ADOPTED THIS REGULATION:

Subject matter and scope
Article 1
1
This Regulation establishes ecodesign requirements for the placing on the market and putting into service of servers and online data storage products.
2
This Regulation shall not apply to the following products:
a
servers intended for embedded applications;
b
servers classified as small scale servers in terms of Regulation (EU) No 617/2013;
c
servers with more than four processor sockets;
d
server appliances;
e
large servers;
f
fully fault tolerant servers;
g
network servers;
h
small data storage products;
i
large data storage products.

Definitions
Article 2
1
For the purposes of this Regulation, the definitions set out in the 2010 Regulations apply. The following definitions also apply—
1. ‘server’ means a computing product that provides services and manages networked resources for client devices, such as desktop computers, notebook computers, desktop thin clients, internet protocol telephones, smartphones, tablets, tele-communication, automated systems or other servers, primarily accessed via network connections, and not through direct user input devices, such as a keyboard or a mouse and with the following characteristics:
  1. it is designed to support server operating systems (OS) and/or hypervisors, and targeted to run user-installed enterprise applications;
  2. it supports error-correcting code and/or buffered memory (including both buffered dual in-line memory modules and buffered on board configurations);
  3. all processors have access to shared system memory and are independently visible to a single OS or hypervisor;
2. ‘server with more than four processor sockets’ means a server containing more than four interfaces designed for the installation of a processor. For multi-node servers, this term refers to a server having more than four processor sockets in each server node;
3. ‘embedded application’ means a software application that permanently resides in an industrial or consumer device, typically stored in a non-volatile memory such as read-only memory or flash memory;
4. ‘server appliance’ means a server that is not intended to execute user-supplied software, delivers services through one or more networks, is typically managed through a web or command line interface and is bundled with a pre-installed OS and application software that is used to perform a dedicated function or set of tightly coupled functions;
5. ‘resilient server’ means a server designed with extensive reliability, availability, serviceability and scalability features integrated in the micro architecture of the system, central processing unit (CPU) and chipset;
6. ‘large server’ means a resilient server which is shipped as a pre-integrated/pre-tested system housed in one or more full frame racks and that includes a high connectivity input/output subsystem with a minimum of 32 dedicated input/output slots;
7. ‘multi-node server’ means a server that is designed with two or more independent server nodes that share a single enclosure and one or more power supply units. In a multi-node server, power is distributed to all nodes through shared power supply units. Server nodes in a multi-node server are not designed to be hot-swappable;
8. ‘fully fault tolerant server’ means a server that is designed with complete hardware redundancy (to simultaneously and repetitively run a single workload for continuous availability in mission critical applications), in which every computing component is replicated between two nodes running identical and concurrent workloads (i.e., if one node fails or needs repair, the second node can run the workload alone to avoid downtime);
9. ‘network server’ means a network product which contains the same components as a server in addition to more than 11 network ports with a total line rate throughput of 12 Gb/s or more, the capability to dynamically reconfigure ports and speed and support for a virtualized network environment through a software defined network;
10. ‘data storage product’ means a fully-functional storage system that supplies data storage services to clients and devices attached directly or through a network. Components and subsystems that are an integral part of the data storage product architecture (e.g., to provide internal communications between controllers and disks) are considered to be part of the data storage product. In contrast, components that are normally associated with a storage environment at the data centre level (e.g. devices required for operation of an external storage area network) are not considered to be part of the data storage product. A data storage product may be composed of integrated storage controllers, data storage devices, embedded network elements, software, and other devices;
11. ‘Hard Disk Drive’ (HDD) means a data storage device which reads and writes to one or more rotating magnetic disk platters;
12. ‘Solid State Drive’ (SSD) means a data storage device that reads and writes to non-volatile solid state memory instead of rotating magnetic platters for data storage;
13. ‘data storage device’ means a device providing non-volatile data storage, with the exception of aggregating storage elements such as subsystems of redundant arrays of independent disks, robotic tape libraries, filers, and file servers and storage devices which are not directly accessible by end-user application programs, and are instead employed as a form of internal cache;
14. ‘online data storage product’ means a data storage product designed for online, random-access of data, accessible in a random or sequential pattern, with a maximum time to first data of less than 80 milliseconds;
15. ‘small data storage product’ means a data storage product containing a maximum of three data storage devices;
16. ‘large data storage product’ means a high end or mainframe data storage product that supports more than 400 data storage devices in its maximum configuration and with the following required attributes: no single point of failure, non-disruptive serviceability and integrated storage controller;
17. ‘market surveillance’ and ‘market surveillance authority’ have the meanings set out in Article 2 of RAMS;
18. ‘the 2010 Regulations’ means the Ecodesign for Energy-Related Products Regulations 2010.
2
For the purposes of Annexes II to V, additional definitions are set out in Annex I.

Ecodesign requirements and timetable
Article 3
1
The ecodesign requirements for servers and online data storage products are set out in Annex II.
2
From 1 March 2020 servers shall comply with the ecodesign requirements set out in Annex II points 1.1.1, 1.2.1, 1.2.2, 2.1, 2.2, 3.1, 3.3 and 3.4.
3
From 1 March 2020 online data storage products shall comply with the ecodesign requirements set out in Annex II points 1.1.1, 1.2.1, 1.2.2, 3.2, 3.3 and 3.4.
a
From 1 March 2021 servers and online data storage products shall comply with the ecodesign requirement set out in Annex II point 1.2.3.
b
From 1 January 2023 servers and online data storage products shall comply with the ecodesign requirements set out in Annex II point 1.1.2.
c
Compliance with ecodesign requirements shall be measured and calculated in accordance with the methods set out in Annex III.

Conformity assessment
Article 4
1
For the purposes of regulation 4(2)(a) of the 2010 Regulations, the procedure for assessing whether an energy-related product complies with this implementing measure is the internal design control procedure set out in Part 1 of Schedule 1A to those Regulations, or the management system procedure set out in Part 2 of that Schedule.
2
For the purposes of the conformity assessment pursuant to substitute “regulation 4(2)(a) of the 2010 Regulations, the technical documentation shall contain —
a
the information set out in point 3.4 of Annex 2; and
b
the details and results of the calculations carried out in accordance with—
i)
where applicable, point 2 of Annex 2; and
ii
Annex 3 (measurements and calculations).

Verification procedure for market surveillance purposes
Article 5
When performing market surveillance checks to assess compliance with the requirements set out in this Regulation, the market surveillance authority must apply the verification procedure described in Annex 4.

Circumvention
Article 6
The manufacturer, importer or authorised representative shall not place on the market products that have been designed to be able to detect they are being tested (e.g. by recognizing the test conditions or test cycle), and to react specifically by automatically altering their performance during the test with the objective of reaching a more favourable level for any of the parameters ... in the technical documentation or included in any of the documentation provided.

Indicative benchmarks
Article 7
The indicative benchmarks for best-performing servers and data storage products available on the market on 7 April 2019 are set out in Annex V.

Review
Article 8
1.
The Secretary of State must, before 25th December 2024—
a
evaluate this Regulation, taking into account the speed of technological progress; and
b
publish a report stating whether or not in their opinion this Regulation should be amended.
2.
If the Secretary of State concludes under paragraph (1) that this Regulation should not be amended, the Secretary of State must review this conclusion from time to time and publish a new report under paragraph (1)(b) at intervals not exceeding 5 years.

Amendment to Regulation (EU) No 617/2013
Article 9
Regulation (EU) No 617/2013 is amended as follows:
1. Article 1 is amended as follows:
  1. paragraph 1 is replaced by the following:
1.
This Regulation establishes ecodesign requirements for the placing on the market of computers.
;
  2. in paragraph 2, point (h) is deleted;
  3. in paragraph 3, points (a) to (d) are deleted;
2. Article 2 is amended as follows:
  1. point 2 is deleted;
  2. point 4 is replaced by the following:
(4)

“Internal power supply” means a component designed to convert AC voltage from the mains to DC voltage(s) for the purpose of powering the computer and has the following characteristics:
    1. is contained within the computer casing but is separate from the main computer board;
    2. the power supply connects to the mains through a single cable with no intermediate circuitry between the power supply and the mains power; and
    3. all power connections from the power supply to the computer components, with the exception of a DC connection to a display in an integrated desktop computer, are internal to the computer casing.
Internal DC-to-DC converters used to convert a single DC voltage from an external power supply into multiple voltages for use by a computer are not considered internal power supplies;
;
  3. points 12 to 16 are deleted;
  4. point 22 is replaced by the following:
(22)
“Product type” means desktop computer, integrated desktop computer, notebook computer, desktop thin client, workstation, mobile workstation, small-scale server, game console, docking station, internal power supply or external power supply;
;
3. Article 3 is replaced by the following:

Ecodesign requirements
Article 3
The ecodesign requirements for computers are set out in Annex II.
Compliance of computers with the applicable ecodesign requirements shall be measured in accordance with the methods set out in Annex III.
;
4. in Article 7, the second paragraph is replaced by the following:
Checking of computers for compliance with the applicable ecodesign requirements shall be carried out in accordance with the verification procedure set out in point 2 of Annex III to this Regulation.
;
5. Annex II is amended as follows:
  1. point 5.2 is deleted;
  2. the title of point 7.3 is replaced by the following:
Workstation, mobile workstation, desktop thin client and small-scale server
.

Entry into force
Article 10
This Regulation shall enter into force on the twentieth day following that of its publication in the Official Journal of the European Union.
However, Article 9 shall apply from 1 March 2020.
...
Done at Brussels, 15 March 2019.
For the Commission
The President
Jean-Claude Juncker
ANNEX I

Definitions applicable to Annexes II to V
For the purposes of Annexes II to V the following definitions shall apply:
1. ‘server with one or two processor sockets’ means a server containing one or two interfaces designed for the installation of a processor. For multi-node servers, this term refers to a server having one or two processor sockets in each server node;
2. ‘Input/Output (I/O) device’ means a device, which provides data input and output capability between a server or a data storage product and other devices. An I/O device may be integral to the server motherboard or may be connected to the motherboard via expansion slots (such as Peripheral Component Interconnect, or Peripheral Component Interconnect Express);
3. ‘motherboard’ means the main circuit board of a server or a data storage product. For purposes of this regulation, the motherboard includes connectors for attaching additional boards and typically includes the following components: processor, memory, BIOS, and expansion slots;
4. ‘processor’ means the logic circuitry that responds to and processes the basic instructions that drive a server or a data storage product. For purposes of this regulation, the processor is the CPU of the server. A typical CPU is a physical package to be installed on the server motherboard via a socket or direct solder attachment. The CPU package may include one or more processor cores;
5. ‘memory’ means a part of a server or a data storage product external to the processor in which information is stored for immediate use by the processor, expressed in gigabyte (GB);
6. ‘expansion card’ means an internal component connected by an edge connection over a common/standard interface such as Peripheral Component Interconnect Express providing additional functionality;
7. ‘graphics card’ means an expansion card containing one or more graphics processing units with a local memory controller interface and local graphics-specific memory;
8. ‘buffered double data rate (DDR) channel’ means a channel or memory port connecting a memory controller to a defined number of memory devices in a server. A typical server may contain multiple memory controllers, which may in turn support one or more buffered DDR channels. As such, each buffered DDR channel serves only a fraction of the total addressable memory space in a server;
9. ‘blade server’ means a server that is designed for use in a blade chassis. A blade server is a high-density device that functions as an independent server and includes at least one processor and system memory, but is dependent upon shared blade chassis resources (e.g., power supply units, cooling) for operation. A processor or memory module will not be considered a blade server when the technical documentation for the product does not indicate that it scales up a standalone server;
10. ‘blade chassis’ means an enclosure that contains shared resources for the operation of blade servers, blade storage, and other blade form-factor devices. Shared resources provided by a blade chassis may include power supply units, data storage, and hardware for direct current power distribution, thermal management, system management, and network services;
11. ‘High Performance Computing (HPC) server’ means a server which is designed and optimized to execute highly parallel applications, for higher performance computing or deep learning artificial intelligence applications. HPC servers must meet all the following criteria:
  1. they consist of multiple computing nodes, clustered primarily to increase computational capability;
  2. they include high speed inter-processing interconnections between nodes;
12. ‘server product family’ means a high-level description referring to a group of servers sharing one chassis and motherboard combination that may contain more hardware and software configurations. All configurations within a server product family must share the following common attributes:
  1. be from the same model line or machine type;
  2. either share the same form factor (i.e., rack-mounted, blade, pedestal) or share the same mechanical and electrical designs with only superficial mechanical differences to enable a design to support multiple form factors;
  3. either share processors from a single defined processor series or share processors that plug into a common socket type;
  4. share the power supply unit(s);
  5. have the same number of available processor sockets and number of available processor sockets populated;
13. ‘power supply unit’ (PSU) means a device that converts alternate current (AC) or direct current (DC) input power to one or more DC power outputs for the purpose of powering a server or a data storage product. A server or data storage product PSU must be self-contained and physically separable from the motherboard and must connect to the system via a removable or hard-wired electrical connection;
14. ‘power factor’ means the ratio of the real power consumed in Watts to the apparent power drawn in Volt Amperes;
15. ‘single output PSU’ means a PSU designed to deliver the majority of its rated output power to one primary DC output for the purpose of powering a server or a data storage product. Single output PSUs may offer one or more standby outputs that remain active whenever connected to an input power source. The total rated power output from any additional PSU outputs that are not primary and standby outputs shall be no greater than 20 Watts. PSUs that offer multiple outputs at the same voltage as the primary output are considered single-output PSUs unless those outputs:
  1. are generated from separate converters or have separate output rectification stages, or
  2. have independent current limits;
16. ‘multi output PSU’ means a PSU designed to deliver the majority of its rated output power to more than one primary DC output for the purpose of powering a server or a data storage product. Multi output PSUs may offer one or more standby outputs that remain active whenever connected to an input power source. The total rated power output from any additional PSU outputs that are not primary and standby outputs shall be no greater than or equal to 20 Watts;
17. ‘direct current server’ means a server that is designed solely to operate on a DC power source;
18. ‘direct current data storage product’ means a data storage product that is designed solely to operate on a DC power source;
19. ‘idle state’ means the operational state in which the OS and other software have completed loading, the server is capable of completing workload transactions, but no active workload transactions are requested or pending by the system (i.e., the server is operational, but not performing any useful work). For servers where Advanced Configuration and Power Interface standards are applicable, idle state corresponds only to System Level S0;
20. ‘idle state power’ (Pidle) is the power demand, in Watts, in idle state;
21. ‘low-end performance configuration’ of a server product family means the combination of two data storage devices, processor with the lowest product of core count and frequency (in GHz) and memory capacity (in GB) that is at least equal to the product of the number of memory channels and the lowest capacity dual in-line memory module (DIMM) (in GB) offered on the server that represents the lowest performance product model within the server product family. All memory channels shall be populated with the same DIMM raw card design and capacity;
22. ‘high-end performance configuration’ of a server product family means the combination of two data storage devices, processor with the highest product of core count and frequency and memory capacity (in GB) equal to or greater than 3 times the product of the number of CPUs, cores and hardware threads that represents the highest performance product model within the product family. All memory channels shall be populated with the same DIMM raw card design and capacity;
23. ‘hardware thread’: means the hardware resources in a CPU core to execute a stream of software instructions. A CPU core may have the resources to execute more than one thread simultaneously;
24. ‘active state efficiency’ (Effserver) means the numerical value for server efficiency as measured and calculated according to Annex III point 3;
25. ‘active state’ means the operational state in which the server is carrying out work in response to prior or concurrent external requests (e.g., instruction over the network). Active state includes both active processing and data seeking/retrieval from memory, cache, or internal/external storage while awaiting further input over the network;
26. ‘server performance’ means the number of transactions per unit of time performed by the server under standardised testing of discrete system components (e.g. processors, memory and storage) and subsystems (e.g. RAM and CPU);
27. ‘maximum power’ (Pmax) means the highest power, in Watts, recorded on the eleven worklet scores according to the standard;
28. ‘CPU performance (Perf CPU)’ means the number of transactions per unit of time performed by the server under standardised testing of the CPU subsystem;
29. ‘Auxiliary Processing Accelerator’ (APA) means a specialized processor and associated subsystem that provide an increase in computing capacity such as graphical processing units or field programmable gate arrays. An APA cannot operate in a server without a CPU. APAs can be installed in a server either on Graphics or Extension add-in cards installed in general-purpose add-in expansion slots or integrated into a server component such as the motherboard;
30. ‘Expansion APA’ means an APA that is on an add-in card installed in an add-in expansion slot. An expansion APA add-in card may include one or more APAs and/or separate, dedicated removable switches;
31. ‘Integrated APA’ means an APA that is integrated into the motherboard or CPU package;
32. ‘product type’ means the design of the server or of the data storage product including the chassis (rack, tower or blade), the number of sockets and, for servers, whether it is a resilient server, a blade server, a multi node server, a HPC server, a server with integrated APA, a direct current server or none of the previous categories;
33. ‘disassembly’ means a process whereby an item is taken apart in such a way that it can subsequently be reassembled and made operational;
34. ‘firmware’ means system, hardware, component, or peripheral programming provided with the product to provide basic instructions for hardware to function inclusive of all applicable programming and hardware updates;
35. ‘secure data deletion’ means the effective erasure of all traces of existing data from a data storage device, overwriting the data completely in such a way that access to the original data, or parts of them, becomes infeasible for a given level of effort;
36. ‘declared values’ means the values provided by the manufacturer, importer or authorised representative in the technical documentation in accordance with point 3.4 of Annex 2, for the verification of conformity by the market surveillance authority.
ANNEX II

Ecodesign requirements
1.

SPECIFIC ECODESIGN REQUIREMENTS FOR SERVERS AND ONLINE DATA STORAGE PRODUCTS
1.1.

PSU efficiency and power factor requirements
1.1.1.
From 1 March 2020, for servers and online data storage products, with the exception of direct current servers and of direct current data storage products, the PSU efficiency at 10 %, 20 %, 50 % and 100 % of the rated load level and the power factor at 50 % of the rated load level shall not be less than the values reported in Table 1.

Table 1

Minimum PSU efficiency and power factor requirements from 1 March 2020
| Minimum PSU efficiency | Minimum power factor
% of rated load | 10 % | 20 % | 50 % | 100 % | 50 %
Multi output | — | 88 % | 92 % | 88 % | 0,90
Single output | — | 90 % | 94 % | 91 % | 0,95
1.1.2.
From 1 January 2023, for servers and online data storage products, with the exception of direct current servers and of direct current data storage products, the PSU efficiency at 10 %, 20 %, 50 % and 100 % of the rated load level and the power factor at 50 % of the rated load level shall not be less than the values reported in Table 2.

Table 2

Minimum PSU efficiency and power factor requirements from 1 January 2023
| Minimum PSU efficiency | Minimum power factor
% of rated load | 10 % | 20 % | 50 % | 100 % | 50 %
Multi output | — | 90 % | 94 % | 91 % | 0,95
Single output | 90 % | 94 % | 96 % | 91 % | 0,95
1.2.

Material efficiency requirements
1.2.1.
From 1 March 2020, manufacturers shall ensure that joining, fastening or sealing techniques do not prevent the disassembly for repair or reuse purposes of the following components, when present:
1. data storage devices;
2. memory;
3. processor (CPU);
4. motherboard;
5. expansion card/graphic card;
6. PSU;
7. chassis;
8. batteries.
1.2.2.
From 1 March 2020, a functionality for secure data deletion shall be made available for the deletion of data contained in all data storage devices of the product.
1.2.3.
From 1 March 2021, the latest available version of the firmware shall be made available from two years after the placing on the market of the first product of a certain product model for a minimum period of eight years after the placing on the market of the last product of a certain product model, free of charge or at a fair, transparent and non-discriminatory cost. The latest available security update to the firmwares shall be made available from the time a product model is placed on the market until at least eight years after the placing on the market of the last product of a certain product model, free of charge.
2.

SPECIFIC ECODESIGN REQUIREMENTS ONLY FOR SERVERS WITH ONE OR TWO PROCESSOR SOCKETS
2.1.

Idle state power
From 1 March 2020, the idle state power (Pidle ) of servers, with the exception of resilient servers, HPC servers and servers with integrated APA, shall not exceed the value calculated using the following equation:
Pidle = Pbase + ΣPadd_i
where Pbase is the basic idle state power allowance in Table 3, and ΣPadd_i is the sum of the idle state power allowances for applicable, additional components, as determined per Table 4. For blade servers, Pidle is calculated as the total measured power divided by the number of installed blade servers in the tested blade chassis. For multi-node servers, the number of sockets are counted per node while Pidle is calculated as the total measured power divided by the number of installed nodes in the tested enclosure.

Table 3

Base idle state power allowances
Product type | Base idle state power allowance, Pbase (W)
1-socket servers (neither blade nor multi-node servers) | 25
2-socket servers (neither blade nor multi-node servers) | 38
Blade or multi-node servers | 40

Table 4

Additional Idle Power Allowances for Extra Components
System characteristics | Applies to | Additional idle power allowance
CPU Performance | All servers | 1 socket: 10 × Perf CPU W 2 socket: 7 × Perf CPU W
Additional PSU | PSU installed explicitly for power redundancy | 10 W per PSU
HDD or SSD | Per installed HDD or SSD | 5,0 W per HDD or SSD
Additional memory | Installed memory greater than 4 GB | 0,18 W per GB
Additional buffered DDR channel | Installed buffered DDR channels greater than 8 channels | 4,0 W per buffered DDR channel
Additional I/O devices | Installed devices greater than two ports of ≥ 1 Gbit, onboard Ethernet | < 1 Gb/s: No Allowance
= 1 Gb/s: 2,0 W/Active Port
> 1 Gb/s and < 10 Gb/s: 4,0 W/Active Port
≥ 10 Gb/s and < 25Gb/s: 15,0 W/Active Port
≥ 25 Gb/s and < 50Gb/s: 20,0 W/Active Port
≥ 50 Gb/s 26,0 W/Active Port
2.2.

Active state efficiency
From 1 March 2020, the active state efficiency (Effserver) of servers, with the exception of resilient servers, HPC servers and servers with integrated APA, shall not be lower than the values in Table 5.

Table 5

Active state efficiency requirements
Product type | Minimum active state efficiency
1-socket servers | 9,0
2-socket servers | 9,5
Blade or multi-node servers | 8,0
3.

INFORMATION TO BE PROVIDED BY MANUFACTURERS
3.1.
From 1 March 2020, with the exception of custom made servers, made on a one-off basis, the following product information on servers shall be provided in the instruction manuals for installers and end-users (when present with the product), and on the free-access websites of manufacturers, their authorised representatives and importers from the time a product model is placed on the market until at least eight years after the placing on the market of the last product of a certain product model:
1. product type;
2. manufacturer's name, registered trade name and registered trade address at which they can be contacted;
3. product model number, and if applicable the low-end performance configuration and the high-end performance configuration model numbers;
4. year of manufacture;
5. PSU efficiency at 10 % (if applicable), 20 %, 50 % and 100 % of rated output power, with the exception of direct current servers, expressed in % and rounded to the first decimal place;
6. power factor at 50 % of the rated load level, with the exception of direct current servers, rounded to three decimal places;
7. PSU rated power output (Watts), rounded to the nearest integer. If a product model is part of a server product family, all PSUs offered in a server product family shall be reported with the information specified in (e) and (f);
8. idle state power, expressed in Watts and rounded to the first decimal place;
9. list of all components for additional idle power allowances, if any (additional PSU, HDDs or SSDs, additional memory, additional buffered DDR channels, additional I/O devices);
10. maximum power, expressed in Watts and rounded to the first decimal place;
11. declared operating condition class, as detailed in Table 6;
12. idle state power (Watts) at the higher boundary temperature of the declared operating condition class;
13. the active state efficiency and the performance in active state of the server;
14. information on the secure data deletion functionality referred to in point 1.2.2 of this Annex, including instructions on how to use the functionality, the techniques used and the supported secure data deletion standard(s), if any;
15. for blade servers, a list of recommended combinations with compatible chassis;
16. if a product model is part of a server product family, a list of all model configurations that are represented by the model shall be supplied.
If a product model is part of a server product family, the product information required for items e) to m) under point 3.1 shall be reported for the low-end and high-end performance configurations of the server product family.
3.2.
From 1 March 2020, with the exception of custom made data storage products, made on a one-off basis, the following product information on online data storage products shall be provided in the instruction manuals for installers and end-users (when present with the product), and on the free-access websites of manufacturers, their authorised representatives and importers from the time a product model is placed on the market until at least eight years after the placing on the market of the last product of a certain product model:
1. product type;
2. manufacturer's name, registered trade name and registered trade address at which they can be contacted;
3. product model number;
4. year of manufacture;
5. PSU efficiency at 10 % (if applicable), 20 %, 50 % and 100 % of rated output power, with the exception of direct current online data storage products, expressed in % and rounded to the first decimal place;
6. power factor at 50 % of the rated load level, with the exception of direct current online data storage products, rounded to three decimal places;
7. declared operating condition class, as detailed in Table 6; it shall also be indicated that ‘This product has been tested in order to verify that it will function within the boundaries (such as temperature and humidity) of the declared operating condition class’;
8. information on the data deletions tool(s) referred to in point 1.2.2 of this Annex, including instructions on how to use the functionality, the techniques used and the supported secure data deletion standard(s), if any.
3.3.
From 1 March 2020, the following product information on servers and online data storage products shall be made available from the time a product model is placed on the market until at least eight years after the placing on the market of the last product of a certain product model free of charge by manufacturers, their authorised representatives and importers to third parties dealing with maintenance, repair, reuse, recycling and upgrading of servers (including brokers, spare parts repairers, spare parts providers, recyclers and third party maintenance) upon registration by the interested third party on a website provided:
1. indicative weight range (less than 5 g, between 5 g and 25 g, above 25 g) at component level, of the following critical raw materials:
  1. Cobalt in the batteries;
  2. Neodymium in the HDDs;
2. instructions on the disassembly operations referred to in point 1.2.1 of this Annex, including, for each necessary operation and component:
  1. the type of operation;
  2. the type and number of fastening technique(s) to be unlocked;
  3. the tool(s) required.
In the case of servers, if a product model is part of a server product family, the product information required for items a) and b) under point 3.3 shall be reported either for the product model or, alternatively, for the low-end and high-end configurations of the server product family.
3.4.
From 1 March 2020, the following product information on servers and online data storage products shall be provided in the technical documentation for the purposes of conformity assessment pursuant to Article 4:
1. Information listed in points 3.1 and 3.3, in the case of servers
2. Information listed in points 3.2 and 3.3, in the case of data storage products

Table 6

Operating condition classes
| Dry bulb temp °C | Humidity range, non-condensing | |
Operating condition class | Allowable range | Recommended range | Allowable range | Recommended range | Max dew point (°C) | Maximum rate of change (°C/hr)
A1 | 15- 32 | 18-27 | – 12 °C Dew Point (DP) and 8 % relative humidity (RH) to 17 °C DP and 80 % RH | – 9 °C DP to 15 °C DP and 60 % RH | 17 | 5/20
A2 | 10-35 | 18-27 | – 12 °C DP and 8 % RH to 21 °C DP and 80 % RH | Same as A1 | 21 | 5/20
A3 | 5-40 | 18-27 | – 12 °C DP and 8 % RH to 24 °C DP and 85 % RH | Same as A1 | 24 | 5/20
A4 | 5-45 | 18-27 | – 12 °C DP and 8 % RH to 24 °C DP and 90 % RH | Same as A1 | 24 | 5/20
ANNEX III

Measurements and calculations
1.
For the purposes of compliance and verification of compliance with the applicable requirements of this Regulation, measurements and calculations shall be made using designated standards, or using other reliable, accurate and reproducible methods which take into account the generally recognised state of the art, and produce results deemed to be of low uncertainty.
2.

Servers shall be tested either in their individual product model configuration or, for servers which are part of a server product family, in the low-end performance configuration and the high-end performance configuration as declared for Annex II, point 3.1.(p), which includes both hardware configuration and system settings, unless otherwise specified.
All configurations offered within a server product family shall contain the same number of populated processor sockets used during testing. A server product family can be defined for a server with only partially populated sockets (e.g. one processor populated in a two socket server) as long as the configuration(s) are tested as a separate server product family, as required, and meet the same requirements for the number of populated sockets within that separate server product family.
For servers with expansion APA, the unit under test shall be tested with the expansion APA removed, when measuring the idle state power, the active state efficiency) and the server performance in active state. Where an expansion APA relies on a separate Peripheral Component Interconnect Express switch for communication between the APA and CPU, the separate Peripheral Component Interconnect Express card(s) or riser(s) shall be removed for Active State and Idle State testing of all configurations.
For multi-node servers, the unit under test shall be tested for per node power consumption in the fully-populated chassis configuration. All multi-node servers in the multi-node chassis shall share the same configuration (homogeneous).
For blade servers, the unit under test shall be tested for blade server power consumption in the half-populated chassis configuration, and the chassis shall be populated as follows:
1. Individual blade server configuration
  1. All individual blade servers installed in the chassis shall be identical, sharing the same configuration
2. Half chassis population
  1. The number of blade servers required to populate half the number of single-wide blade server slots available in the blade chassis shall be calculated.
  2. For blade chassis having multiple power domains, the number of power domains that is closest to filling half of the chassis shall be chosen. If there are two choices that are equally close to filling half of the chassis, the test shall be performed with the domain or combination of domains which use a higher number of blade servers.
  3. All user manual or manufacturer recommendations for partially populating the chassis, which may include disconnecting some of the power supply units and cooling fans for the unpopulated power domains, shall be followed.
  4. If user manual recommendations are not available or are incomplete, then the following guidance shall be used:
    1. Completely populate the power domains;
    2. If possible, disconnect the power supply units and cooling fans for unpopulated power domains;
    3. Fill all empty bays with blanking panels or an equivalent airflow restriction for the duration of testing.
3.

The data to calculate the active state efficiency (Effserver) and the idle power (Pidle ) shall be measured during the same test according to the relevant standard, where the idle power can be measured either before or after running part of the test for the active state efficiency.
The active state efficiency (Effserver) of servers shall be calculated as:
Effserver = exp [Wcpu × ln (Effcpu ) + WMemory × ln (Eff Memory ) + WStorage × ln (Eff Storage )]
where: WCPU , WMemory and WStorage are the weightings applied to the CPU, Memory and Storage worklets respectively, as follows:
- WCPU is the weighting assigned to the CPU worklets = 0,65
- WMemory is the weighting assigned to the Memory worklets = 0,30
- WStorage is the weighting assigned to the Storage worklets = 0,05
and
Eff_{CPU} = (7 i = 1 Eff_i)^{1 ∕ 7}
where:
- i = 1 for worklet Compress;
- i = 2 for worklet LU;
- i = 3 for worklet SOR;
- i = 4 for worklet Crypto;
- i = 5 for worklet Sort;
- i = 6 for worklet SHA256;
- i = 7 for worklet Hybrid SSJ;
Eff_{Memory} = (2 i = 1 Eff_i)^{1 ∕ 2}
where:
- i = 1 for workletFlood3;
- i = 2 for workletCapacity3;
Eff_{Storage} = (2 i = 1 Eff_i)^{1 ∕ 2}
where:
- i = 1 for workletSequential;
- i = 2 for workletRandom;
and
Eff_i = 1000 Perf_i/Pwr_i
where
— Perfi
- Geometric mean of the normalized interval performance measurements;
— Pwri
- Geometric mean of the measured interval power values;
In order to create a single energy efficiency metric for a server the interval efficiency values for all the different worklets shall be combined using the following procedure:
1. combining the interval efficiency values for the individual worklets using the geometric mean to obtain individual worklet Efficiency values for the worklet;
2. combining worklet efficiency scores using the geometric mean function by workload type (CPU, Memory, Storage) to obtain a workload type value;
3. combining the three workload types using a weighted geometric mean function to obtain a single, total server efficiency value.
ANNEX IV

Verification procedure for market surveillance purposes
The verification tolerances set out in this Annex relate only to the verification by the market surveillance authority of the declared values.
The manufacturer, importer or authorised representative of a product must not use the verification tolerances—
a
to establish the declared values;
b
to interpret the declared values; or
c
to communicate better performance.
Where a model has been designed to be able to detect it is being tested (e.g. by recognizing the test conditions or test cycle), and to react specifically by automatically altering its performance during the test with the objective of reaching a more favourable level for any of the parameters specified in this Regulation or included in the technical documentation or included in any of the documentation provided, the model shall be considered not compliant.
When verifying the compliance of a product model with the requirements laid down in this Regulation, the market surveillance authority must apply the following procedure—
1. The Member State authorities shall verify one single unit of the model or, in case the manufacturer reports on a server product family, of the model configuration. If the verification is done on the low-end performance configuration or the high-end performance configuration, the declared values shall be the values for the respective configuration. If the verification is performed on a randomly selected or ordered model configuration, the declared values shall be the values for the high-end performance configuration.
2. The model or model configuration shall be considered to comply with the applicable requirements if:
  1. the declared values and, where applicable, the values used to calculate these values, are not more favourable for the manufacturer or importer than the results of the corresponding measurements carried out pursuant to paragraph 1(2)(b)(vii) of that Schedule; and
  2. the declared values meet any requirements laid down in this Regulation, and any required product information published by the manufacturer or importer does not contain values that are more favourable for the manufacturer or importer than the declared values; and
  3. when the market surveillance authority test the unit of the model or alternatively, in case the manufacturer declared the server to be represented by a server product family, of the low-end performance configuration or the high-end performance configuration of the server product family, the determined values (the values of the relevant parameters as measured in testing and the values calculated from these measurements) comply with the respective verification tolerances as given in Table 7 ; and
  4. the manufacturer, importer or authorised representative has complied with the information requirements in point 3.1 of Annex 2 (servers) or, as the case may be, point 3.2 of Annex 2 (data storage products); and
  5. when the market surveillance authority checks the unit of the model, the unit complies with the resource efficiency requirements in point 3.3 of Annex 2.
3. If the results referred to in point (2)(a), (b), (d) or (e) are not achieved, the model and all model configurations that are covered by the same product information (according to Annex II point 3.1(p) shall be considered not to comply with this Regulation.
4. If the result referred to in point 2(c) is not achieved:
  1. for models or model configurations from a server product family that are produced in quantities of less than five per year, the model and all model configurations that are covered by the same product information (according to Annex II point 3.1(p)) shall be considered not to comply with this Regulation;
  2. for models that are produced in quantities of five or more per year, the market surveillance authority shall select three additional unit of the same model or alternatively, in case the manufacturer , importer or authorised representative declared the server to be represented by a server product family, a unit of both the low-end performance configuration and the high-end performance configuration for testing.
5. The model or model configuration shall be considered to comply with the applicable requirements if, for the units selected in accordance with point 4(b), the arithmetical mean of the determined values complies with the respective verification tolerances given in Table 7.
6. If the result referred to in point 5 is not achieved, the model and all model configurations that are covered by the same product information (according to Annex II point 3.1(p) shall be considered not to comply with this Regulation.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
The Member State authorities shall use the measurement and calculation methods set out in Annex III.
The market surveillance authority shall only apply the verification tolerances that are set out in Table 7 of this Annex and shall only use the procedure described in points 1 to 6 for the requirements referred to in this Annex. No other tolerances shall be applied.

Table 7

Verification tolerances
Parameters | Verification tolerances
PSU efficiency (%) | The determined value shall not be lower than the declared value by more than 2 %.
Power factor | The determined value shall not be lower than the declared value by more than 10 %.
Idle state power, Pidle and maximum power (W) | The determined value shall not exceed the declared value by more than 10 %.
Active state efficiency and performance in active state | The determined value shall not be lower than the declared value by more than 10 %.
ANNEX V

Indicative benchmarks referred to in Article 6
The following indicative benchmarks are identified for the purposes of this Regulation.
They refer to the best available technology by 7 April 2019.
The indicative benchmarks for the best available technology on the market for servers and online data storage products are as follows.

Table 8

Benchmark for idle state power, server efficiency and operating condition
Product type | Idle power, W | Active state efficiency | Operating condition class
Tower server, 1 socket | 21,3 | 17 | A3
Rack server, 1 socket | 18 | 17,7 | A4
Rack server, 2 socket, low performance | 49,9 | 18 | A4
Rack server, 2 socket, high performance | 67 | 26,1 | A4
Rack server, 4 socket | 65,1 | 34,8 | A4
Blade server, 2 socket | 75 | 47,3 | A3
Blade server, 4 socket | 63,3 | 21,9 | A3
Resilient server, 2 socket | 222 | 9,6 | A3
Data storage products | Not applicable | Not applicable | A3

Table 9

Benchmark for PSU efficiency at 10 %, 20 %, 50 % and 100 % load level and power factor at 20 % or 50 % load level
PSU nameplate power | 10 % | 20 % | 50 % | 100 %
< 750W | 91,17 % | 93,76 % | 94,72 % Power factor > 0,95 | 94,14 %
≥ 750W | 95,02 % | 95,99 % Power factor > 0,95 | 96,09 % | 94,69 %
OJ L 285, 31.10.2009, p. 10.
COM(2015) 614 final.
SWD(2018) 36 final.
Regulation (EU) 2016/679 of the European Parliament and of the Council of 27 April 2016 on the protection of natural persons with regard to the processing of personal data and on the free movement of such data, and repealing Directive 95/46/EC (General Data Protection Regulation) (OJ L 119, 4.5.2016, p. 1).
Directive 2014/35/EU of the European Parliament and of the Council of 26 February 2014 on the harmonisation of the laws of the Member States relating to the making available on the market of electrical equipment designed for use within certain voltage limits (OJ L 96, 29.3.2014, p. 357).
Regulation (EU) No 1025/2012 of the European Parliament and of the Council of 25 October 2012 on European standardisation, amending Council Directives 89/686/EEC and 93/15/EEC and Directives 94/9/EC, 94/25/EC, 95/16/EC, 97/23/EC, 98/34/EC, 2004/22/EC, 2007/23/EC, 2009/23/EC and 2009/105/EC of the European Parliament and of the Council and repealing Council Decision 87/95/EEC and Decision No 1673/2006/EC of the European Parliament and of the Council (OJ L 316, 14.11.2012, p. 12).
Commission Regulation (EU) No 617/2013 of 26 June 2013 implementing Directive 2009/125/EC of the European Parliament and of the Council with regard to ecodesign requirements for computers and computer servers (OJ L 175, 27.6.2013, p. 13).
Art. 5 substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(4)
Words in Art. 6 omitted (E.W.S.) (1.10.2021) by virtue of The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(3)(b)
Words in Annex 4 substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(8)(f)
Words in Annex 4 substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(8)(c)
Art. 4(1) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(3)(a)
Words in Annex 5 substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(9)
Words in Annex 4 substituted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(6)(a)
Art. 8 (previously omitted by virtue of S.I. 2020/1528, reg. 14(5)) inserted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(4)
Words in Annex 4 point 3 substituted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(6)(c)
Words in Annex 4 point 4(b) inserted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(6)(d)
Words in Annex 4 point 6 substituted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(6)(f)
Words in Annex 1 point (4) inserted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(5)(b)
Words in Annex 1 point (5) inserted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(5)(c)
Annex 4 point 7 omitted (31.12.2020) by virtue of The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(8)(e)
Words in Annex 4 point 5 substituted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(6)(e)
Words in Art. 6 substituted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(3)(a)
Words in Annex 4 point 2(a) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(8)(d)(ii)
Words in Signature omitted (31.12.2020) by virtue of The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(6)
Words in Art. 2.1 substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(2)(a)
Annex 1 point (36) inserted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(5)(d)
Words in Annex 3 point 1 substituted (31.12.2020) by virtue of The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(7)
Words in Annex 4 substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(8)(a)
Words in Art. 4(2) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(3)(b)
Art. 2.1(17)(18) inserted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(4), 14(2)(b)
Annex 4 point 2(d)(e) and word inserted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(6)(b)(ii)
Words in Annex 1 point (3) substituted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(5)(a)
Words in Annex 4 point 2(a) substituted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(6)(b)(i)
Words in Art. 4(2) substituted (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) Regulations 2021 (S.I. 2021/1097), regs. 1(2), 3(2)