CHAPTER II

Application, data reporting and monitoring rules

General obligation to monitor
Article 6
The operator of an installation, applying for or receiving free allocation ... shall monitor the data to be submitted as listed in Annex IV to this Regulation, based on a monitoring methodology plan approved by the regulator under Article 8.
Words in Regulation substituted (31.12.2020) by The Greenhouse Gas Emissions Trading Scheme (Amendment) Order 2020 (S.I. 2020/1557), art. 2(2), Sch. 1 para. 2
Words in Art. 6 omitted (31.12.2020) by virtue of The Greenhouse Gas Emissions Trading Scheme (Amendment) Order 2020 (S.I. 2020/1557), art. 2(2), Sch. 1 para. 10(2)
Words in Art. 6 substituted (31.12.2020) by The Greenhouse Gas Emissions Trading Scheme (Amendment) Order 2020 (S.I. 2020/1557), art. 2(2), Sch. 1 para. 10(3)