CHAPTER III

Allocation rules

Cessation of operations of an installation
Article 26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Art. 26 omitted (2.2.2025) by virtue of The Greenhouse Gas Emissions Trading Scheme (Amendment) Order 2025 (S.I. 2025/100), arts. 2(2), 18(2) (with art. 20(2))