Article 2 Definitions
‘Flemish Panel’ means the last tapered netting section of a beam trawl, the anterior of which is directly attached to the cod-end. The upper and lower netting sections of the panel must be constructed of at least 120 mm mesh as measured between the knots and the panel must have a stretched length of at least 3 m.