Article 1
The Laboratorio Central de Veterinaria — Área de Sanidad Animal, Madrid, Spain shall have the responsibilities and tasks of the European Union reference laboratory for African horse sickness and bluetongue as set out respectively in Annex III to Directive 92/35/EEC and Annex II(B) to Directive 2000/75/EC.