ANNEX II
In Annex II(A) to Directive 2000/75/EC, the name and contact details of the laboratory are replaced by the following:
Laboratorio Central de Veterinaria — Área de Sanidad Animal
Ctra. M-106, P.K. 1,4
28110 Algete (Madrid)
ESPAÑA
.