CHAPTER III

QUALITY REQUIREMENTS
SECTION 4

Quality monitoring

Quality monitoring
Article 17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Arts. 16-37 omitted (31.12.2020) by virtue of The Single Digital Gateway Regulation (Revocation) (EU Exit) Regulations 2020 (S.I. 2020/793), regs. 1, 2(e)